2 Lottery machine interval
For the purposes of section 235(2)(d)(ii) of the Gambling Act 2005, where a machine dispenses lottery tickets or otherwise enables a person to enter a lottery, there must be an interval of not less than one hour between each entry to a lottery and any announcement by the machine of the results of that lottery.