SCHEDULE 1 THE REGISTER

PART 1 Interpretation
1 In this Schedule—
“cumulative in-year mass emissions” means the cumulative in-year mass emissions reported by the operator—
(a) of a participating plant in England or Wales, to the Agency in accordance with the conditions of the permit granted under Part II of the Pollution Prevention and Control (England and Wales) Regulations 2000;
S.I. 2000/1973.
(b) of a participating plant in Scotland, to SEPA in accordance with the conditions of the permit granted under Part II of the Pollution Prevention and Control (Scotland) Regulations 2000; or
S.S.I. 2000/323.
(c) of a participating plant in Northern Ireland, to the Chief Inspector in accordance with the conditions of the permit granted under regulation 12 of the Pollution Prevention and Control Regulations (Northern Ireland) 2003; and
S.R. 2003/46.
“verified annual mass emission”, in relation to a LCPD pollutant, means the total amount emitted in each calendar year verified in accordance with regulation 7.