SCHEDULE 1 THE NEW FIREFIGHTERS’ PENSION SCHEME (ENGLAND)

PART 11 PENSIONABLE PAY, PENSION CONTRIBUTIONS AND PURCHASE OF ADDITIONAL SERVICE

CHAPTER 1 PENSIONABLE PAY AND PENSION CONTRIBUTIONS

3 Pension contributions
(1) A firefighter member shall pay pension contributions to the authority at the rate of 8.5% of his pensionable pay for the time being.
(2) The contributions payable under paragraph (1) may be deducted by the authority from each instalment of pensionable pay as it becomes due, but this is subject to any other method of payment that may be agreed between the authority and the member.
(3) For the purposes of this rule, the pensionable pay of a firefighter member during a period of maternity, paternity or adoption leave shall be the pay that the person receives for that period including the value of any statutory maternity, paternity or adoption pay under the Social Security Contributions and Benefits Act 1992.
1992 c. 4.