SCHEDULE 5 Minimum Criteria for the Assessment of United Kingdom Notified Bodies
Regulation 24(2)
1 Availability of personnel and of the necessary means and equipment;
2 Technical competence and professional integrity of personnel;
3 Independence in preparing the reports and performing the verification function provided for in the EMC Directive;
4 Independence of staff and technical personnel in relation to all interested parties, groups or persons directly or indirectly concerned with the equipment in question;
5 Maintenance of professional secrecy by personnel; and
6 Possession of civil liability insurance unless such liability is covered by the Government of the United Kingdom.