5 Period of time within which hearing to be held
Hearings to be held under the provisions listed in column 1 of the table in Schedule 1 must be commenced within the period of time specified in column 2 of the table and in a case where the hearing is to be held on more than one day, the hearing must be arranged to take place on consecutive working days.