2005 No. 3227
OFFSHORE INSTALLATIONS
The Offshore Installations (Safety Zones) (No. 3) Order 2005
Made 23rd November 2005
Coming into force 14th December 2005

The Secretary of State, in exercise of the powers conferred upon him by sections 22(1) and (2) of the Petroleum Act 1987 (“the Act”), and for the purpose of giving effect to proposals submitted to him by the Health and Safety Commission under section 24(2A) of the Act, hereby makes the following Order:
1987 c. 12; section 24(2A) was inserted by S.I.1993/1823.