SCHEDULE 1 SAFETY ZONES
Article 2
(1)	(2)	(3)
Name or other designation of the offshore installation	Latitude North	Longitude
Atlantic Well, Block 14/26a, Atlantic Field	58° 00.86'	00° 53.60' W
Cromarty Well, Block 13/30a, Cromarty Field	58° 03.24'	01° 04.38' W
Farragon, Block 16/28, Farragon Field	58° 09.33'	01° 30.56' E
Forvie North Production Manifold, Block 3/15, Forvie North Field	60° 31.41'	01° 52.13 ' E
Forvie North Xmas Tree, Block 3/15, Forvie North Field	60° 30.74'	01° 50.12' E
Hunter Well, Block 44/23a, Hunter Field	54° 18.51'	02° 25.30' E
South Tweedsmuir Injection Well, Block 21/1a, South Tweedsmuir Field	57° 57.68'	00° 07.70' E
Tweedsmuir Manifold, Block 21/1a, Tweedsmuir Field	57° 59.77'	00° 11.71' E
Tweedsmuir South Manifold, Block 21/1a, South Tweedsmuir Field	57° 57.07'	00° 11.72' E
SCHEDULE 2
Article 3
1. (1) The Offshore Installations (Safety Zones) Order 2005 shall be amended as follows—
S.I. 2005/1656.
(2) In the Schedule for the last two lines of the table substitute—

“Xmas Tree for Well 3/29a-5, Block 3/29a, Rhum Field	60º 09.09'	01º 44.82' E
Xmas Tree for Well 3/29a-SF1, Block 3/29a, Rhum Field	60º 06.94'	01º 43.38' E”