Statutory Instruments
2005 No. 1908
ANIMALS, ENGLAND
ANIMAL HEALTH
The Diseases of Animals (Approved Disinfectants) (Amendment) (England) Order 2005
Made 12th July 2005
Coming into force 8th August 2005

The Secretary of State, in exercise of her powers under sections 1, 7 and 23(f) and (g) of the Animal Health Act 1981, makes the following Order:
1981 c. 22; see section 86(1) for definitions of “the Minister” and “the Ministers”. Functions of “the Ministers”, so far as exercisable in relation to England, were transferred to the Minister of Agriculture, Fisheries and Food by the Transfer of Functions (Agriculture and Food) Order 1999 (S.I. 1999/3141) and functions of the Minister of Agriculture, Fisheries and Food were transferred to the Secretary of State by article 2 of the Ministry of Agriculture, Fisheries and Food (Dissolution) Order 2002 (S.I. 2002/794).

Title, commencement and application
1. (1) This Order may be cited as the Diseases of Animals (Approved Disinfectants) (Amendment) (England) Order 2005 and comes into force on 8 August 2005.
(2) This Order applies in England only.

Amendments to the Diseases of Animals (Approved Disinfectants) Order 1978
2. (1) The Diseases of Animals (Approved Disinfectants) Order 1978 is amended in relation to England in accordance with the following provisions of this article.
S.I. 1978/32, the last relevant amendment to the lists of approved disinfectants being S.I. 2004/2891.
(2) In paragraph (2) of article 6 of the 1978 Order (which specifies the date until which disinfectants subject to transitional provisions remain approved), for “28th February 2005” substitute “31st October 2005”.
(3) For Schedule 1 to the 1978 Order (which lists approved disinfectants), substitute Schedule 1 to this Order.
(4) For Schedule 2 to the 1978 Order (which lists disinfectants subject to transitional provisions), substitute Schedule 2 to this Order.

Revocation
3. The Diseases of Animals (Approved Disinfectants) (Amendment) (England) Order 2004 is revoked.
S.I. 2004/2891.
Ben Bradshaw
Parliamentary Under Secretary of State
Department for Environment, Food and Rural Affairs
12th July 2005

SCHEDULE 1 Schedule to be substituted for Schedule 1 to the 1978 Order
Article 2(3)

“SCHEDULE 1 Approved disinfectants
Articles 4 and 5
	Orders in respect of which use is approved; and dilution rates				
Disinfectant	Foot–and– Mouth Disease Orders	Swine Vesicular Diseases Order	Diseases of Poultry Order	Tuberculosis Orders	General Orders
Action Iodophor Disinfectant (New Formulation)	525	400	150	15	110
Activate 04	—	—	50	—	25
Agri Disinfex	550	600	125	20	180
Agrichlor	—	—	953 The volume of mls. of water to which 1 g of the product is to be added.	—	360
Agricide	100	300	300	–	—
AgriGene	—	—	—	—	50
Agrimar Iodophor Disinfectant	550	600	125	20	180
Alodine	550	—	185	33	50
Alodine (New Formulation)	525	400	150	15	110
Alzogur	—	—	—	—	2
Amazon MP36	99	99	99	—	99
Animax H D Extra	—	—	—	—	100
Annihilate	50	30	20	—	30
Annihilate ACR	50	30	20	—	30
Antec Ambicide	—	—	—	—	30
Antec Chicgard	—	—	—	—	31
Antec Farm Fluid	219	100	—	—	29
Antec Hipodine	450	300	130	—	180
Antec Hyperox	150	50	375	—	179
Antec (LPAH) Liquid Perasafe Animal Health	125	—	110	—	120
Antec New Formula White Fluid	—	—	45	—	103
Antec Ovation	—	—	—	—	46
Antec Virkon E	1300	200	280	—	120
Antec Virkon S	1300	200	280	—	100
Antigermen Potente	525	400	150	15	110
Avi-Cleanse	240	300	80	—	100
Bactacol KK Disinfectant (New Formulation)	80	250	190	—	—
Bactipal 5.22	500	80	150	—	200
Bactipal DB	500	80	150	—	178
Ballista	200	—	200	—	200
Barrier V1	—	—	50	—	40
Battles Black Disinfectant Fluid	—	—	45	—	60
Battles Universal Disinfectant Fluid	300	—	—	37	—
Battles White Disinfectant Fluid	—	—	50	—	60
Betane Plus	—	—	50	—	15
Biocid	525	400	150	15	110
Biocid 15	250	300	100	—	50
Biocid 30	550	600	125	20	180
Bio-Dine	—	—	145	—	—
Bio-Guard	—	—	80	—	—
Bio-Kill	140	—	365	—	160
Bio-OO-Cyst	—	—	125	—	—
Bio-Phen	—	175	190	—	—
Bio-Phen Plus	400	160	210	—	—
Bio-Shield	—	—	155	—	—
Biospot	—	—	953	—	360
Bio-VX	1200	135	285	—	100
Black Disinfectant	—	—	41	—	80
Black Extreme	710	—	200	—	—
Blitz	800	160	145	—	256
Breaker	200	—	200	—	200
Bulk Tank Iodophor	550	—	185	33	50
C S Disinfectant	—	—	65	—	40
Carela Bio Plus	10	—	—	—	—
Carela Bio-Des	99	—	—	—	—
Cascade Disinfectant	800	160	145	—	256
Cekocide	1300	—	—	—	160
Chemtab	—	—	953	—	360
Chlorisept	—	—	953	—	360
Citric Acid BP	500	—	—	—	—
Clinidine	320	—	140	—	—
Clinidine 28	500	400	170	—	100
Combat 2	550	600	125	20	180
Commando (New Formulation)	80	250	190	—	—
Credence 200	299	299	449	—	299
Credence 1000	299	299	449	—	299
Cromessol New Animal Health Care Disinfectant (New Formulation)	80	250	190	—	—
D50	800	160	145	—	256
Defence 7	100	300	300	—	—
Delladet VS2	—	—	—	—	10
Deocide PA Disinfectant	800	160	145	—	256
Deosan Iodel FD	215	234	130	—	147
Deptil AF	—	—	100	—	—
Detsan 1	—	—	—	—	25
Disteola Disinfectant	240	300	80	—	100
Divosan DB	—	—	60	—	49
Emprasan Approved Iodine Disinfectant	—	—	—	—	111
Envirocare A	99	99	99	—	99
Envirocide +	—	—	145	—	—
Enviroguard	60	300	150	—	50
Equigard	—	50	100	—	22
Equisept	299	299	449	—	299
Equipsept (Tablets)	299	299	449	—	299
ERFS White Disinfectant Fluid	—	—	50	—	60
Euractiv S+	99	300	150	—	37
F10SC General Farm Disinfectant	499	—	—	—	—
F10SC Veterinary Disinfectant	—	—	35	—	9
FAM	525	500	100	—	110
FAM (New Formulation)	525	400	150	15	110
FAM 15	250	300	100	—	50
FAM 30	550	600	125	20	180
FAM 30C	891	970	200	30	290
Farm Phenol +	—	175	190	—	—
Farm Phenol Super +	—	—	210	—	—
FarmKlear	80	250	190	—	—
Farmsan	550	600	125	20	180
Formalin BP (Containing not less than 34% Formaldehyde)	9	9	—	—	—
Genus Universal (New Formulation)	550	600	125	20	180
GeoSIL	—	—	—	—	9
Germacert FG Plus	—	—	10	—	—
GPC8	80	—	200	—	—
GPC8 (New Formulation)	80	250	190	—	—
Halamid	200	90	1000	—	300
Haztab	—	—	953	—	360
Hemex Chlor Powder	—	2000	—	—	530
Hemexol Iodine Liquid	160	140	100	—	110
Hemexol Iodine Liquid Plus	—	800	200	—	200
Hemexol Liquid G	—	50	75	—	18
Hemexol V 260	—	220	260	—	103
Hemexol Virucidal Powder	1300	—	—	—	160
HPPA	—	—	400	—	190
Hyprelva SF	99	300	150	—	37
Hysol DSL 1 & 2	70	15	—	—	100
Hyspray PA 5	99	20	350	—	158
Impact	1300	300	300	—	112
Incidin AL	30	400	90	—	19
Incidin OXI	500	80	150	—	178
Incidin PD	—	—	20	—	32
Intercept	150	450	200	—	200
Iodocleanse New Formulation	600	650	160	—	—
Iodel FD II	450	500	145	15	150
Iodet	550	—	185	33	50
Jentabs Agriculture	299	299	449	—	299
Jentabs Professional	—	—	953	—	360
Jewel-Black 34	—	—	—	—	77
Kennel Safe Disinfectant (New Formulation)	80	250	190	—	—
Kick Start (2)	800	160	145	—	256
Kilcrobe WO Disinfectant Fluid Special Grade	—	—	—	—	99
Killgerm Black Disinfectant RW Coefficient 18/22	—	—	41	—	80
Killgerm Iodair	250	260	61	—	—
Killgerm Lysol BP	—	—	50	—	49
Killgerm White Farm Disinfectant	—	—	21	—	100
Leecyl Farm Disinfectant	—	—	50	—	—
Lifeline	—	50	75	—	18
Life Guard (New Formulation)	80	250	190	—	—
Lindores 30	550	600	125	20	180
Lysol BP 1968	9	—	39	—	49
Maskells Omnicide	60	300	150	—	50
Micro-Chlor	—	100	250	—	210
Microcide 755N	—	—	50	—	15
Microdine	160	140	100	—	110
Macrodyne 200	—	800	200	—	200
Macroline-500	—	220	260	—	103
Macroclor 1000	—	2000	—	—	530
Macrokil 200	—	300	220	—	64
Macromist	—	—	50	—	15
Mikro-Quat	—	—	—	—	15
Milton Double Concentrate	—	100	—	—	25
Mira 8	80	250	190	—	—
Mira 30	550	600	125	20	180
MP36	99	99	99	—	99
Novagen FP	240	180	80	18	145
Omnicide	60	300	150	—	50
Omnicide Extra	—	300	175	—	27
Ortho-phosphoric Acid (Technical Grade)	330	—	—	—	—
Ovitek Biocidal Sol. Concentrate	—	—	200	—	25
Oxykil	800	160	145	—	256
P100 +	—	—	80	—	—
P100 Max	—	—	155	—	—
Parvovirucide	100	300	300	—	—
Parvocide Plus	60	300	150	—	50
Perbac Farm	800	160	145	—	256
Peroxide	1320	220	—	—	—
Pharmaq Vetredine	550	600	125	20	180
Pharmaq Vetrekill	550	600	125	20	180
Pharmaq Vetroxide PA	550	600	125	20	180
Phoraid Disinfectant	—	—	—	—	25
Phor-Vet	—	—	—	—	25
Pinalene	—	—	—	—	11
Powerkill	1300	300	300	—	112
Premier	—	—	—	—	10
Proxitane AHC (2)	800	160	145	—	256
Purogene	250	240	20	—	22
QC Iodocleanse	—	—	140	—	—
QC Virukill 260	—	—	260	—	—
Quatdet Clear	—	—	—	—	13
Rapicid	550	600	125	20	180
Response 904 Vet	—	—	29	—	—
Ryodophor SP	240	160	91	—	145
Safe4	—	—	—	—	2
San-5-Pine	—	—	—	—	11
Secure Iodophor Disinfectant	150	—	30	—	30
Septrivet	299	299	449	—	299
Septrivet 17	299	299	449	—	299
Sodium Carbonate (Decahydrate) Complying with BS 3674 of 1963	24	—	—	—	—
Sodium Hydroxide	—	100	—	—	—
Somplex Detsan	—	—	—	—	8
Sorgene 5	75	75	—	—	200
Sorgene Biodine	215	234	130	—	147
Stable Safe Disinfectant (New Formulation)	80	250	190	—	—
Stableguard	150	450	200	—	200
Steril Tabs	200	—	200	—	200
Sterilite Farm Disinfectant Extra	840	400	200	20	82
Sterilite Virucidal Disinfectant	60	300	150	—	50
Sterilite White Disinfectant	—	—	45	—	—
Sterlitz	240	300	80	—	100
Sulphamic Acid	500	—	—	—	—
Supercide	150	450	200	—	—
Supercide Extra	—	—	165	—	25
Supercide Max	—	—	155	—	—
Supercide Plus	—	300	175	—	27
Superdine	550	600	125	20	180
Superfluid Max	550	—	185	33	50
Superdine Max	550	—	185	33	50
Superguard	150	450	200	—	200
Superkill	—	50	100	—	22
Superperacetic Max	—	—	400	—	190
Superstrong Max	—	—	240	—	—
Super Virucidal Max	1300	200	300	—	112
Surekill	—	—	40	—	20
SWC Bacto Detsan	20	10	—	—	10
SWC Bacto Detsan Defoamed	20	10	—	—	10
SWC Broadol (New Formulation)	80	250	190	—	—
SWC Maxikleen	600	400	100	—	43
SWC V3	1300	300	300	—	112
Tegodor Farm New	—	—	51	—	—
Terminator Disinfectant	100	300	300	—	—
Terminol	—	—	—	—	33
TK10	150	450	200	—	200
TK12	—	50	100	—	22
Total	50	30	20	—	30
Total Farm Disinfectant	550	600	125	20	180
Ultracide	100	300	300	—	—
V26	200	200	300	—	200
Vanodin	525	400	150	15	110
Vanodine	525	400	150	15	110
Vanodine FAM	525	400	150	15	110
Vanodox	200	30	300	—	300
Vanoquat	—	—	—	—	7
Venno FF Super	50	—	150	—	88
Vesphene D39	10	—	50	—	55
Vibacide	100	—	40	—	17
Viktor	1300	200	280	—	120
Viking	1300	200	280	—	120
Viragi Plus	—	—	190	—	—
Viraguard (New Formulation)	80	250	190	—	—
Viratec P	1300	—	150	—	100
Virex	1300	200	300	—	112
VI-RID	—	—	10	—	—
Virkon Professional	1300	200	280	—	120
Virkon S Tablet	—	—	—	—	100
Viro-Cid	100	250	150	—	—
Virofree	200	—	300	—	150
Viroguard	—	—	175	—	—
Virokill	60	300	150	—	50
Virophen	—	200	210	—	—
Virophen Plus	—	—	240	—	—
Virophor 2.8%	550	—	185	33	50
Viroshield	—	—	165	—	25
Viroxide Super	1320	220	—	—	—
Virucidal Extra	1300	300	300	—	112
Virudine	—	—	140	—	—
Zal Perax (2)	800	160	145	—	256
Zoetox 5	—	—	50	—	50”

SCHEDULE 2 Schedule to be substituted for Schedule 2 to the 1978 Order
Article 2(4)

“SCHEDULE 2 Approved disinfectants subject to transitional provisions
Articles 4 and 6
	Orders in respect of which use is approved; and dilution rates				
Disinfectant	Foot–and– Mouth Disease Orders	Swine Vesicular Diseases Order	Diseases of Poultry Order	Tuberculosis Orders	General Orders
Agrisept MC Tabs	271 The volume of mls. of water to which 1 g of the product is to be added.	448	271	—	450
Agilan Red Label	550	600	125	30	180
Alpharma Vetrechlor	271	448	271	—	450
Antec Farm Fluid	—	—	39	—	—
Antec Farm Fluid S	700	200	—	30	115
Antec Longlife	—	—	60	—	60
Antec Longlife 250 S	500	200	250	25	90
Antec New Formula Farm Fluid	300	110	70	35	65
Antec Virudine	600	650	140	—	125
Battles Universal Disinfectant Fluid	—	—	60	—	—
Blitz	—	—	—	44	—
Cascade Disinfectant	—	—	—	44	—
D50	—	—	—	44	—
Deocide PA Disinfectant	—	—	—	44	—
Hemex Chlor Powder	—	—	500	—	—
Hyprelva 4+	—	400	90	4	37
Jeyes Fluid	—	—	30	—	50
Kick Start (2)	—	—	—	44	—
Kirbychlor	271	448	271	—	450
Macroclor 1000	—	—	500	—	—
Oxykil	—	—	—	44	—
Petsafe	—	—	Use undiluted	—	—
Oxysan Max	—	—	365	—	—
Prosept	—	240	130	—	—
Sorgene 5	—	—	100	—	—
Sterlite PA	—	—	—	44	—
Superpereactic	—	—	—	44	—
Tegodor Farm	—	—	51	—	—
Terminal Black-Black Fluid RW 34	—	—	—	—	77
Venno FF Super	—	—	—	25	—
Virucide +	—	—	285	—	—
Virochlor	271	448	271	—	450
Zal Perax (2)	—	—	—	44	—
Zal GQ Disinfectant	60	300	150	—	50”

(This note is not part of the Order)
This Order, which applies in England only, amends the Diseases of Animals (Approved Disinfectants) Order 1978 (S.I. 1978/32) and revokes the Diseases of Animals (Approved Disinfectants) (England) Order 2004 (S.I. 2004/2891). It comes into force on 8th August 2005.
The Order substitutes for Schedules 1 and 2 to the 1978 Order the Schedules 1 and 2 set out in this Order. Schedule 1 lists disinfectants approved by the Secretary of State and Schedule 2 lists disinfectants which, although no longer approved, may continue to be used as approved disinfectants until 31st October 2005.
This Order was notified in draft to the European Commission in accordance with Directive 98/34/EC, as amended by Directive 98/48/EC.
A full regulatory impact assessment has not been produced for this instrument as it has no impact on the costs of business.