SCHEDULES

SCHEDULE 13 PROTECTIVE PROVISIONS

PART I PROTECTION FOR ELECTRICITY, GAS AND WATER UNDERTAKERS
4 Notwithstanding anything in this Order or shown on the deposited plans Network Rail shall not acquire any apparatus under the powers of this Order otherwise than by agreement.