2 Internal drainage boards
Part III of the Local Government Act 1974 shall apply to every internal drainage board the continued existence of which is confirmed by section 1 of the Land Drainage Act 1991 or which is constituted or reconstituted pursuant to sections 3 to 5 of that Act.