6 Insertion of Schedule 1A – Certificates of Technical Competence
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Regulations revoked (6.4.2008) by The Environmental Permitting (England and Wales) Regulations 2007 (S.I. 2007/3538), reg. 1(b), Sch. 22 (with regs. 69-72)