6 Wards of the parish of Hockley Heath
1 The parish of Hockley Heath shall be divided into four parish wards which shall bear the names Cheswick Green, Dickens Heath, Hockley Heath Village and Tidbury Green; and the wards shall comprise the areas designated on sheet 4 by reference to the name of the ward and demarcated by orange lines.
2 The number of councillors to be elected for the parish wards of Cheswick Green and Dickens Heath shall be four, for the parish ward of Hockley Heath Village shall be three, and for the parish ward of Tidbury Green shall be two.