2002 No. 2099
HEALTH AND SAFETY
The Packaging, Labelling and Carriage of Radioactive Material by Rail Regulations 2002 (revoked)
Regulations revoked (10.5.2004) by The Carriage of Dangerous Goods and Use of Transportable Pressure Equipment Regulations 2004 (S.I. 2004/568), reg. 1, Sch. 14
Made 6th August 2002
Laid before Parliament 12th August 2002
Coming into force 2nd September 2002

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

PART I INTRODUCTION

1 Citation and commencement
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2 Interpretation
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3 Meaning of “operator”
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4 Application
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5 Revocations
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

PART II GENERAL

6 Determination of radioactive material
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7 Determination of the transport index
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

8 Determination of the criticality safety index
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

9 Duties of a consignor of radioactive material
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

10 Duties of a train operator
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

11 Duties of a consignee
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

12 Duties of the operator of a wagon, a container, a tank container, a portable tank and a tank wagon
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

13 Duties of the designers of packages and manufacturers of packagings
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

PART III APPROVALS AND NOTIFICATIONS

14 Approval of package designs
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

15 Approval of design for special form radioactive material and for low dispersible radioactive material
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

16 Shipment approvals other than approvals for shipments under special arrangement
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

17 Approval of shipments under special arrangement
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

18 Notification and registration of serial numbers
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

PART IV QUALITY ASSURANCE AND TRAINING

19 Quality assurance
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

20 Training of persons involved in the carriage of radioactive material
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

PART V SECURITY MEASURES AND EMERGENCY ARRANGEMENTS

21 Security
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

22 Emergencies
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

23 Emergency plans
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

24 Marshalling and formation of trains
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

25 Prevention of fire, explosion and leakage
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

PART VI MISCELLANEOUS

26 Keeping of information
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

27 Exemption certificates
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

28 Defence
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

29 International provisions
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

30 Transitional provisions
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

31 Amendments to the Transport of Dangerous Goods (Safety Advisers) Regulations 1999
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

32 Amendments to the Radiation (Emergency Preparedness and Public Information) Regulations 2001
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

SCHEDULE 1 DEFINITIONS OF “MINE” AND “OWNER”
Regulation 2(1)

PART I DEFINITION OF “MINE”
1 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

PART II MEANING OF “OWNER”
7 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
8 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

SCHEDULE 2 REVOCATIONS
Regulation 5
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

SCHEDULE 3 TRANSITIONAL PROVISIONS
Regulation 30

PART I INTERPRETATION
1 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

PART II PACKAGES NOT REQUIRING COMPETENT AUTHORITY APPROVAL OF DESIGN UNDER THE 1985 INTERNATIONAL SAFETY REGULATIONS
2 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
8 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

PART III PACKAGE DESIGNS APPROVED UNDER THE 1973 INTERNATIONAL SAFETY REGULATIONS
9 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
10 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
11 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
12 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
13 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

PART IV PACKAGE DESIGNS APPROVED UNDER THE 1985 INTERNATIONAL SAFETY REGULATIONS
14 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
15 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
16 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
17 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
18 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

PART V SPECIAL FORM RADIOACTIVE MATERIAL APPROVED UNDER THE 1973 INTERNATIONAL SAFETY REGULATIONS OR THE 1985 INTERNATIONAL SAFETY REGULATIONS
19 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
20 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
21 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

SCHEDULE 4 AMENDMENTS TO THE RADIATION (EMERGENCY PREPAREDNESS AND PUBLIC INFORMATION) REGULATIONS 2001
Regulation 32

1 Interpretation
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2 Amendment of the principal Regulations
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
8 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
9 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
10 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .