2000 No. 845

FOOD, ENGLAND

The Medical Food (England) Regulations 2000 (revoked)
Made
21st March 2000
Laid before Parliament
31st March 2000
Coming into force
1st November 2001
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Title, commencement and extent
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Interpretation
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Restrictions on sale
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Enforcement
4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Offences and penalties
5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Application of the improvement notice provisions of the Act
5A. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Defence in relation to exports
6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Application of various provisions of the Food Safety Act 1990
7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Transitional arrangements
8. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
SCHEDULE

Modification of the improvement notice provisions of the Act
PART 1

Modification of section 10(1)
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
PART 2

Modification of section 32(1)
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
PART 3

Modification of section 35 (punishment of offences)
4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
PART 4

Modification of section 37(1) and (6)
5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
8. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
9. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
PART 5

Modification of section 39(1) and (3)
10. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
11. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Regulations revoked (22.2.2020) by The Food for Specific Groups (Food for Special Medical Purposes for Infants, Infant Formula and Follow-on Formula) (Information and Compositional Requirements) (Amendment etc.) (England) Regulations 2020 (S.I. 2020/43), reg. 1(1), Sch. 6 (with savings in reg. 8(2)); and Regulations, in so far as still in force, amended (31.12.2020) by The Nutrition (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/651), regs. 1(1), 10