Statutory Instruments
2000 No. 730
TELECOMMUNICATIONS
The Radio Equipment and Telecommunications Terminal Equipment Regulations 2000
Regulations revoked (with savings) (26.12.2017) by The Radio Equipment Regulations 2017 (S.I. 2017/1206), regs. 1, 78(1) (with regs. 3-5, 77, 78(2)); and Regulations (as saved) modified (E.W.S.) (31.12.2020) by S.I. 2017/1206, reg. 78(2)(2A) (as amended by The Product Safety and Metrology etc. (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/696), reg. 1, Sch. 29 para. 45(3) (as amended by S.I. 2020/676, regs. 1(1), 2); 2020 c. 1, Sch. 5 para. 1(1))
Made 9th March 2000
Laid before Parliament 13th March 2000
Coming into force 8th April 2000

The Secretary of State, being a Minister designated for the purposes of section 2(2) of the European Communities Act 1972 in relation to measures relating to the approval of radio equipment and telecommunications terminal equipment, in exercise of the powers conferred on him by that section, hereby makes the following Regulations:
S.I. 1989/1327 and S.I. 1999/2788.
1972 c. 68.

PART I INTRODUCTORY

Citation, commencement, revocations and disapplications
1. (1) These Regulations may be cited as the Radio Equipment and Telecommunications Terminal Equipment Regulations 2000 and shall come into force on 8th April 2000.
(2) The following Orders and Regulations are hereby revoked:
Telecommunication Apparatus (Advertisements) Order 1982
S.I. 1982/490.
Telecommunication Apparatus (Advertisements) Order 1985
S.I. 1985/719.
Telecommunication Apparatus (Advertisements) (Amendments) Order 1985
S.I. 1985/1030.
Telecommunication Apparatus (Marking and Labelling) Order 1982
S.I. 1982/491.
Telecommunication Apparatus (Marking and Labelling) Order 1985
S.I. 1985/717.
Telecommunication Apparatus (Marking and Labelling) (Amendment) Order 1985
S.I. 1985/1031.
Telecommunication Apparatus (Bell Noise Labelling) Order 1985
S.I. 1985/718.
Telecommunication Apparatus (Approval Fees) (British Approvals Board for Telecommunications) Order 1990
S.I. 1990/1679.
Telecommunication Apparatus (Approval Fees) (British Approvals Board for Telecommunications) Order 1992
S.I. 1992/1875.
Telecommunications Terminal Equipment Regulations 1992
S.I. 1992/2423.
Telecommunications Terminal Equipment (Amendment and Extension) Regulations 1994
S.I. 1994/3129.
Telecommunications Terminal Equipment (Amendment) Regulations 1995
S.I. 1995/144.
(3) Sections 22 and 84 of the Act, ... ... shall cease to apply to apparatus covered by these Regulations.
Words in reg. 1(3) revoked (7.3.2005) by The Electromagnetic Compatibility Regulations 2005 (S.I. 2005/281), regs. 1, 104 (with regs. 102, 103)
Words in reg. 1(3) omitted (8.12.2016) by virtue of The Electrical Equipment (Safety) Regulations 2016 (S.I. 2016/1101), reg. 1, Sch. 7 para. 4 (with reg. 3)

Interpretation
2. (1) In these Regulations (except in Schedule 9)—
“the Act” means the Telecommunications Act 1984;
1984 c. 12.
“active implantable medical device” shall have the meaning in Article 1 of Council Directive 90/385/EEC of 20 June 1990 on the approximation of the laws of the Member States relating to active implantable medical devices;
OJL No. 189, 20.7.1990, p 17.
“apparatus” means any equipment that is either radio equipment or telecommunications terminal equipment or both;
“the CE marking” has the meaning given in regulation 10;
“the Commission” means the Commission of the European Union;
“a component or a separate technical unit of a vehicle” shall have the meaning in Article 2 of Council Directive 92/61/EEC;
OJL No. 225, 10.8.1992, p 72.
“the Directive” means Directive 1999/5/EC of the European Parliament and of the Council on radio equipment and telecommunications terminal equipment and the mutual recognition of their conformity;
OJL No. 91, 7.4.1999, p 10.
“the Director” means the Director General of Telecommunications appointed under section 1 of the Act;
“enforcement authority” has the meaning given in paragraphs 1 and 2 of Schedule 9;
“equipment class” means a class identifying particular types of apparatus which under the Directive are considered similar and those interfaces for which the apparatus is designed. Apparatus may belong to more than one equipment class;
“harmful interference” means interference which endangers the functioning of a radio navigation service or of other safety services or which otherwise seriously degrades, obstructs or repeatedly interrupts a radio communications service operating in accordance with the applicable Community or national regulations;
“harmonised standard” means a technical specification adopted by a recognised standards body under a mandate from the Commission in conformity with the procedures laid down in Directive 98/34/EC of the European Parliament and of the Council for the purpose of establishing a European requirement, compliance with which is not compulsory;
OJL No. 204, 21.7.1998, p 37.
“interface” means either or both of—
(i) a network termination point which is a physical connection point at which a user is provided with access to public telecommunications network, and
(ii) an air interface specifying the radio path between radio equipment
and their technical specifications;
“medical device” shall have the meaning in Article 1 of Council Directive 93/42/EEC of 14 June 1993 concerning medical devices;
OJL No. 169, 12.7.1993, p 1.
“OFCOM” means the Office of Communications established under the Office of Communications Act 2002.
“public telecommunications networks” means telecommunications networks used wholly or partly for the provision of publicly available telecommunications services;
“radio equipment” means a product, or a relevant component thereof, capable of communication by means of the emission and/or reception of radio waves utilising the spectrum allocated to terrestrial/space radio communication;
“radio waves” means electromagnetic waves of frequencies from 9 kHz to 3,000 GHz, propagated in space without artificial guide;
“responsible person” means the manufacturer of apparatus or his authorised representative within the European Union, or any other person who places the apparatus on the market;
“technical construction file” means a file describing the apparatus and providing information and explanations as to how the essential requirements (within the meaning of regulation 4) applicable to the apparatus have been met;
“telecommunications terminal equipment” means a product enabling communication, or a relevant component thereof, which is intended to be connected directly or indirectly by any means whatsoever to interfaces of public telecommunications networks;
Words in Regulations substituted (22.4.2011) by The Treaty of Lisbon (Changes in Terminology) Order 2011 (S.I. 2011/1043), arts. 2, 3-6
Words in reg. 2(1) inserted (29.12.2003) by The Radio Equipment and Telecommunications Terminal Equipment (Amendment No. 2) Regulations 2003 (S.I. 2003/3144), regs. 1, 2(3)
and any other expression used in these Regulations which is also used in the Directive has the same meaning in these Regulations as it has in the Directive.
(2) For the purposes of these Regulations, unless the context otherwise requires, a reference to a numbered regulation or Schedule is a reference to the regulation or Schedule so numbered in these Regulations and a reference—
(i) in a regulation to a paragraph is a reference to a paragraph in that regulation;
(ii) to an Annex is a reference to an Annex of the Directive.
(3) For the purposes of these Regulations, Annexes I, II, III, IV, V, VI and VII are respectively set out in Schedules 1, 2, 3, 4, 5, 6 and 7, and a reference to a paragraph in an Annex is a reference to a paragraph in that Annex as set out in the respective Schedule.
(4) Except for the references to the European Union in the definition of “the Commission” and in relation to the Official Journal, a reference to the European Union includes a reference to the EEA, and a reference to a member State includes a reference to an EEA State: for this purpose—
(a) the “EEA” means the European Economic Area;
(b) an “EEA State” means a State which is a contracting party to the EEA Agreement; and
(c) the “EEA Agreement” means the Agreement on the European Economic Area signed at Oporto on 2nd May 1992 as adjusted by the Protocol signed at Brussels on 17th March 1993.
Reg. 2(4) inserted (25.7.2003) by The Radio Equipment and Telecommunications Terminal Equipment (Amendment) Regulations 2003 (S.I. 2003/1903), regs. 1, 2(3)

PART II GENERAL PRINCIPLES

Scope and Exclusions
3. (1) Subject to paragraphs (4) and (5), these Regulations shall apply to all apparatus.
(2) Where apparatus incorporates, as an integral part or as an accessory—
(a) a medical device; or
(b) an active implantable medical device,
the apparatus shall be governed by these Regulations without prejudice to the application of Council Directive 93/42/EEC of 14 June 1993; or Council Directive 90/385/EEC of 20 June 1990; or the Medical Devices Regulations 1994; or the Active Implantable Medical Devices Regulations 1992.
OJL No. 189, 20.7.1990, p 17.
S.I. 1994/3017.
S.I. 1992/3146.
Words in reg. 3(2) substituted (25.7.2003) by The Radio Equipment and Telecommunications Terminal Equipment (Amendment) Regulations 2003 (S.I. 2003/1903), regs. 1, 2(4)
(3) Where apparatus constitutes a component or a separate technical unit of a vehicle, the apparatus shall be governed by these Regulations without prejudice to the application of Council Directive 72/245/EEC of 20 June 1972; or Council Directive 92/61/EEC of 30 June 1992; or the Motor Vehicles (Type Approval) Regulations 1980; or the Motorcycle (EC Type Approval) Regulations 1995.
OJL No. 152, 6.7.1972, p 15 as last amended by Commission Directive 95/54/EC (OJL 266.8.11.1995, p 1).
OJL No. 225, 10.8.1992, p 72.
S.I. 1980/1182.
S.I. 1995/1513.
Words in reg. 3(3) substituted (25.7.2003) by The Radio Equipment and Telecommunications Terminal Equipment (Amendment) Regulations 2003 (S.I. 2003/1903), regs. 1, 2(4)
(4) These Regulations shall not apply to apparatus exclusively used for the purposes of public security, defence, State security (including the economic well-being of the State) or the activities of the State in the area of criminal law.
(5) These Regulations shall not apply to equipment listed in Schedule 1.

Essential Requirements
4. (1) Apparatus when properly installed and maintained and used for its intended purpose shall satisfy the essential requirements set out in this regulation.
(2) The following essential requirements shall apply to all apparatus:
(a) the protection of the health and safety of the user and any other person, including the objectives with respect to safety requirements contained in Council Directive 73/23/EEC (but as if there were no voltage limit);
OJL No. 77, 26.3.1973, p 29.
(b) the protection requirements with respect to electromagnetic compatibility contained in Council Directive 89/336/EEC;
OJL No. 139, 23.5.1989, p 19.
(3) In addition, radio equipment shall be so constructed that it effectively uses the spectrum allocated to terrestrial/space radio communication and orbital resources so as to avoid harmful interference.
(4) When a measure has been adopted by the Commission pursuant to Articles 3.3, 6.2 and 15 of the Directive and published in the Official Journal of the European Union determining that apparatus shall be so constructed that—
(a) it interworks via networks with other apparatus and that it can be connected to interfaces of the appropriate type throughout the European Union; or that
(b) it does not harm the network or its functioning nor misuse network resources, thereby causing an unacceptable degradation of service; or that
(c) it incorporates safeguards to ensure that the personal data and privacy of the user and of the subscriber are protected; or that
(d) it supports certain features ensuring avoidance of fraud; or that
(e) it supports certain features ensuring access to emergency services; or that
(f) it supports certain features in order to facilitate its use by users with a disability,
apparatus within the scope of that measure shall meet the requirements of that measure from the date specified in that measure.

PART III COMPLIANCE

General duty relating to the placing on the market and putting into service of apparatus
5. (1) Subject to paragraph (4) and regulations 6, 7 and 8, no person shall place on the market or put into service any apparatus unless the requirements of paragraph (2) and (in the case of radio equipment) the requirements of paragraph (3) have been complied with in relation to it.
Words in reg. 5(1) inserted (25.7.2003) by The Radio Equipment and Telecommunications Terminal Equipment (Amendment) Regulations 2003 (S.I. 2003/1903), regs. 1, 2(5)(a)
(2) The requirements in respect of any apparatus are that:
(a) it satisfies the essential requirements set out in regulation 4: and without prejudice to other means of complying for the purpose of satisfying those requirements, where a harmonised standard covers one or more of the relevant essential requirements, any apparatus or part thereof constructed in accordance with that harmonised standard or part thereof shall be presumed to comply with that or, as the case may be, those essential requirements;
(b) the information has been provided in accordance with regulation 11;
(c) the appropriate conformity assessment procedures in respect of the apparatus have been carried out in accordance with regulation 9;
(d) the requirements of regulation 10 and Schedule 7 (CE and other marking) have been complied with;
Reg. 5(2)(d) substituted (25.7.2003) by The Radio Equipment and Telecommunications Terminal Equipment (Amendment) Regulations 2003 (S.I. 2003/1903), regs. 1, 2(5)(b)
(e) a declaration of conformity has been drawn up in respect of it by the manufacturer of the apparatus or other responsible person in accordance with Schedule 2, 3, 4 or 5.
(3) In respect of radio equipment using frequency bands whose use is not harmonised throughout the European Union it is also a requirement that notification of intention to place it on the market shall have been given in accordance with regulation 12.
(4) Paragraph (1) does not prohibit the putting into service of apparatus in relation to which the requirements of paragraphs (2)(b), (c), (d) and (e) have not been complied with.
Reg. 5(4) inserted (25.7.2003) by The Radio Equipment and Telecommunications Terminal Equipment (Amendment) Regulations 2003 (S.I. 2003/1903), regs. 1, 2(5)(c)

Exceptions in respect of placing on the market and putting into service
6. (1) For the purposes of regulation 5, apparatus shall not be regarded as being placed on the market where that apparatus—
(a) is intended to be exported to a country outside the European Union; or
(b) is imported into the European Union for re-export to a country outside the European Union; or
(c) is transferred from the manufacturer in a third country to his authorised representative established within the European Union who is responsible on behalf of the manufacturer for ensuring compliance with the Directive; or
(d) is transferred to a manufacturer for further processing (for example, to modify the product or to integrate it into another product, or to put his own name on the product);
save that this paragraph shall not apply if the CE marking, or any inscription liable to be confused therewith, is affixed thereto.
(2) Subject to paragraph (3), no offence under the Act or the Wireless Telegraphy Acts 1949 to 1967, nor any offence of incitement to commit such an offence, shall be committed by reason only that apparatus which does not comply with these Regulations is displayed at a trade fair, exhibition or demonstration if a notice is displayed in relation to the apparatus to the effect
(a) that it does not satisfy the provisions of these Regulations; and
(b) that it may not be placed on the market or put into service until those provisions are satisfied by a responsible person.
Reg. 6(2)-(4) substituted for reg. 6(2) (25.7.2003) by The Radio Equipment and Telecommunications Terminal Equipment (Amendment) Regulations 2003 (S.I. 2003/1903), regs. 1, 2(6)
(3) Paragraph (2) does not apply in any case in which radio equipment is switched on and thereby causes harmful interference or endangers public health.
(4) The Secretary of State and the Director shall so exercise their respective functions under Part VI of the Act and the Wireless Telegraphy Acts 1949 to 1967 that the putting into service of radio equipment which complies with these Regulations is restricted only for reasons related to the effective and appropriate use of the radio spectrum, avoidance or harmful interference of public health.

The right to connect
7. (1) Operators of public telecommunications networks
(a) shall connect or permit the connection, at an interface, of any telecommunications terminal equipment which meets the requirements of regulation 4 or is equipment which was placed on the market before 8th April 2001 and complied with the provisions of Directive 98/13/EC, the Telecommunication Terminal Equipment Regulations 1992 or section 22 or 84 of the Telecommunications Act 1984;
(b) shall not discontinue such connection lawfully made of any such equipment.
(2) No apparatus is required under sub-paragraphs (1)(a) and (b) or otherwise to be, or to be permitted to be, connected or kept connected if that apparatus
(a) met the requirements of regulation 4 at the time when the connection was made but no longer does so;
(b) was placed on the market before 8th April 2001 and complied with the provisions of Directive 98/13/EC, the Telecommunication Terminal Equipment Regulations 1992 or section 22 or 84 of the Telecommunications Act 1984 at the time when the connection was made but no longer does so;
(c) causes serious damage to a network or harmful radio interference or harm to the network or its functioning; and the operator may refuse connection of that apparatus, disconnect that apparatus or withdraw that apparatus from service provided the operator at the earliest practical opportunity informs the Secretary of State and the Director of its action; or
(d) is, in case of emergency, required to be disconnected to protect the network, provided that
(i) the user may be offered, without delay and without costs, an alternative solution; and
(ii) the operator immediately informs the Secretary of State and the Director.
(3) In any case in which a public telecommunications operator
(a) refuses connection of apparatus declared to be compliant with the provisions of the Directive; or
(b) disconnects such apparatus; or
(c) withdraws it from service
the Secretary of State and the Director may, if they are of the opinion that the apparatus would not cause serious damage to a network or harmful interference or harm to the network or its functioning, require the operator to provide connection, reconnect the apparatus or restore it to service (as the case may be).
Reg. 7 substituted (25.7.2003) by The Radio Equipment and Telecommunications Terminal Equipment (Amendment) Regulations 2003 (S.I. 2003/1903), regs. 1, 2(7)

Transitional provisions in respect of placing on the market and putting into service
8. Notwithstanding the provisions of regulation 5, apparatus may be placed on the market before 8 April 2001, and apparatus so placed on the market may be put into service, if (in either case) it is in accordance with the provisions of Council Directive 98/13/EC, the Telecommunications Terminal Equipment Regulations 1992, or section 22 or 84 of the Act.
OJL No. 74, 12.3.1998, p 1.
S.I. 1992/2423, amended by S.I. 1994/3129, 1995/144.

Conformity assessment procedures for apparatus
9. (1) For the purposes of regulation 5(2)(c), the appropriate conformity assessment procedure for apparatus shall, subject to paragraph (2), be chosen from the procedures set out in Schedules 2, 3, 4 and 5 as follows:
(a) for telecommunications terminal equipment which does not make use of the spectrum allocated to terrestrial/space radio communications and for the receiving parts of radio equipment, the conformity assessment procedures which may be chosen from are those laid down in Schedules 2, 4 and 5;
(b) where radio equipment is not within the scope of subparagraph (a) above and the manufacturer has fully applied harmonised standards, the conformity assessment procedures which may be chosen from are those laid down in Schedules 3, 4 and 5;
(c) where radio equipment is not within the scope of subparagraph (a) above and the manufacturer has not applied harmonised standards or has applied them only in part, the conformity assessment procedures which may be chosen from are those laid down in Schedules 4 and 5.
(2) As an alternative to the procedures set out in paragraph (1), compliance of the apparatus with the essential requirements identified in—
(a) regulation 4(2)(a) may be demonstrated by using the procedures specified in Council Directive 73/23/EEC, and
(b) regulation 4(2)(b) may be demonstrated by using the procedures specified in Article 10(1) and 10(2) of Directive 89/336/EEC,
where apparatus is within the scope of either of those Directives.
(3) Any technical documentation or other information in relation to apparatus required to be retained under the conformity assessment procedure used shall be retained by the person specified in that respect in that conformity assessment procedure for the appropriate period specified in that procedure.

CE marking
10. (1) In these Regulations, “the CE marking” means a marking in the form set out in paragraph 1 of Annex VII as set out in Schedule 7.
(2) The CE marking shall be accompanied by—
(a) the identification number of all notified bodies used where the conformity assessment procedure is carried out in accordance with Schedule 3, 4 or 5;
(b) in the case of radio equipment, the equipment class identifier where one has been assigned.
(3) There shall be marked on the apparatus
(a) the name of the responsible person;
(b) the type identification of the apparatus; and
(c) the batch or serial number assigned to the apparatus by the manufacturer.
Reg. 10(3) substituted (25.7.2003) by The Radio Equipment and Telecommunications Terminal Equipment (Amendment) Regulations 2003 (S.I. 2003/1903), regs. 1, 2(8)
(4) Where apparatus is subject to other directives concerning other aspects and which also provide for the affixing of the CE marking, the markings shall indicate that the apparatus in question is also presumed to conform to the provisions of those other directives. However, should one or more of those directives allow the manufacturer, during a transitional period, to choose which arrangements to apply, the CE marking shall indicate conformity to the provisions only of those directives applied by the manufacturer. In this case the particulars of those directives, as published in the Official Journal, must be given in the documents, notices or instructions required by those directives and accompanying such products.
(5) Subject to paragraph (6) any other marking may be affixed to apparatus provided that the visibility and legibility of the CE marking is not thereby reduced.
(6) The affixing of markings on apparatus which are likely to mislead third parties as to the meaning or form of the CE marking is prohibited.

Information accompanying apparatus
11. There shall be prominently displayed on or accompany the apparatus information for the user as follows:
(a) in the case of all apparatus—
(i) its intended use; and
(ii) a declaration of its conformity to the applicable essential requirements;
(b) in the case of radio equipment, sufficient information on the packaging and the instructions for use to identify the Member States or the geographical area within the Member States where it is intended to be used; and marking on the apparatus as provided for in paragraph 5 of Schedule 7 shall be used when appropriate to alert the user that restrictions or requirements for authorisation of the use of the radio equipment apply in certain Member States;
(c) in the case of telecommuncations terminal equipment, sufficient information to identify the interfaces of public telecommunications networks to which the equipment is intended to be connected.

Notice to be given to the OFCOM before placing radio equipment on the market
12. (1) The responsible person shall, not less than four weeks before the date it is intended to place on the market in the United Kingdom radio equipment using frequency bands whose use is not harmonised throughout the European Union, give notice in writing to the OFCOM which contains—
(a) such information as is required by the OFCOM about the radio characteristics of the equipment, in particular its frequency bands, channel spacing, type of modulation and RF power; and
Word in reg. 12(1)(a) substituted (29.12.2003) by The Radio Equipment and Telecommunications Terminal Equipment (Amendment No. 2) Regulations 2003 (S.I. 2003/3144), regs. 1, 2(4)(a)
(b) where appropriate the identification number of all the notified bodies used.
Word in reg. 12(1) substituted (29.12.2003) by The Radio Equipment and Telecommunications Terminal Equipment (Amendment No. 2) Regulations 2003 (S.I. 2003/3144), regs. 1, 2(4)(b)
(2) Notice given under paragraph (1) shall be effective in respect of all items of equipment, whether placed on the market at the same time or at different times, which are in all material respects identical to each other.
Word in reg. 12 heading substituted (29.12.2003) by The Radio Equipment and Telecommunications Terminal Equipment (Amendment No. 2) Regulations 2003 (S.I. 2003/3144), regs. 1, 2(4)(a)

Publication of and access to information
13. (1) Subject to paragraph (7) below, each public telecommunications network operator shall, in relation to all interfaces in use by the operator at the time this regulation comes into force, notify such interfaces to the Director and publish within 90 days of this regulation coming into force, in an accurate and adequate manner, the technical specifications of the interfaces in accordance with paragraph (5) below.
(2) Before services are provided through any interface which is not published under paragraph (1) above the public telecommunications network operator shall
(a) notify such interface to the Director; and
(b) publish the technical specification of the interface in an accurate and adequate manner and in accordance with paragraph (5) below.
(3) Where any interface to which paragraph (1) or (2) above applies is modified by the public telecommunications network operator
(a) he shall notify such modification to the Director and publish such modification in an accurate and adequate manner and in accordance with paragraph (5) below; and
(b) the modification shall include any change in the description of any interface which may affect the maintenance of effective interoperability of services by means of the interface.
(4) Where any interface to which paragraph (1) or (2) above applies is withdrawn, the public telecommunications network operator shall notify such withdrawal to the Director and publish such withdrawal in accordance with paragraph (5) below.
(5) The requirements as to publication are that
(a) the interface specification published shall
(i) be in sufficient detail to permit the design of telecommunications terminal equipment capable of utilising all services provided through the corresponding interface;
(ii) detail any changes in existing interfaces; and
(iii) include, inter alia, all the information necessary to allow manufacturers to carry out, at their choice, the relevant tests for the essential requirements applicable to the telecommunications terminal equipment; and
(b) the interface specification shall be made readily available by the public telecommunications network operator.
(6) If, following any representation made to it OFCOM concludes that any interface specification contains insufficient information for the purpose of paragraph (5), OFCOM may direct the public telecommunications network operator to
(a) amend the interface specification in order to remedy the defect; and
(b) publish the amended interface specification in accordance with the provisions of paragraph (5).
Reg. 13(6) substituted (29.12.2003) by The Radio Equipment and Telecommunications Terminal Equipment (Amendment No. 2) Regulations 2003 (S.I. 2003/3144), regs. 1, 2(5)
(7) Nothing in this regulation shall require the public telecommunications network operator to publish or send to the Director information which it has already published or sent to the Director.
Reg. 13 substituted (25.7.2003) by The Radio Equipment and Telecommunications Terminal Equipment (Amendment) Regulations 2003 (S.I. 2003/1903), regs. 1, 2(9)

Notified bodies
14. For the purposes of these Regulations, a notified body is a body which has been—
(a) appointed as a notified body pursuant to regulation 15;
(b) appointed by a Member State other than the United Kingdom and notified to the Commission and the other Member States pursuant to Article 11 of the Directive; or
(c) recognised for the purpose of carrying out those functions by inclusion in a mutual recognition agreement relating to the Directive or a similar agreement (including a Protocol to the Europe Agreement, or other Agreement, on Conformity Assessment and Acceptance of Industrial Products) which has been concluded between the European Union and a State other than an EEA State.
Reg. 14(c) inserted (25.7.2003) by The Radio Equipment and Telecommunications Terminal Equipment (Amendment) Regulations 2003 (S.I. 2003/1903), regs. 1, 2(10)

Notified bodies appointed by the Secretary of State
15. (1) The Secretary of State, applying the criteria in Schedule 6 and such other criteria as he thinks fit, may from time to time appoint such persons as he thinks fit to be notified bodies.
(2) An appointment—
(a) may relate to such descriptions of apparatus as the Secretary of State may from time to time determine;
(b) may be made subject to such conditions as the Secretary of State may from time to time determine, and such conditions may include conditions which are to apply upon or following termination of the appointment;
(c) shall, without prejudice to the generality of subparagraph (b) and subject to paragraph (4), require the appointed body to carry out the procedures and specific tasks for which it has been appointed including (where so provided as part of those procedures) surveillance to ensure that the responsible person duly fulfils the obligations arising out of the relevant conformity assessment procedure;
(d) shall be terminated upon 90 days' notice in writing given to the Secretary of State by the notified body; and
(e) may be terminated if it appears to the Secretary of State that any of the conditions of the appointment are not complied with.
(3) Subject to paragraph (2)(d) and (e), an appointment under this regulation may be for the time being or for such period as may be specified in the appointment.
(4) A notified body appointed by the Secretary of State shall not be required to carry out the functions referred to in paragraph (2)(c) if—
(a) the documents submitted to it in relation to carrying out such functions are not in English or another language acceptable to that body; or
(b) the responsible person has not submitted with his application the amount of the fee which the body requires to be submitted with the application pursuant to regulation 16.
(5) If for any reason the appointment of a notified body is terminated under this regulation, the Secretary of State may—
(a) give such directions (either to the body the subject of the termination or to another notified body) for the purpose of making such arrangements for the determination of outstanding applications as he considers appropriate; and
(b) without prejudice to the generality of the foregoing, authorise another notified body to take over its functions in respect of such cases as he may specify.

Fees
16. (1) A notified body appointed by the Secretary of State may charge such fees in connection with, or incidental to, the performance of its functions as it may determine: provided that such fees shall not exceed the sum of the following—
(a) the costs incurred or to be incurred by the notified body in performing the relevant function; and
(b) an amount on account of profit which is reasonable in the circumstances having regard to—
(i) the character and extent of the work done or to be done by the body on behalf of the applicant; and
(ii) the commercial rate normally charged on account of profit for that work or similar work.
(2) A notified body may require the payment of fees or a reasonable estimate thereof in advance of carrying out the work requested by the applicant.

Modification of Licences
17. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Reg. 17 revoked (25.7.2003) by The Radio Equipment and Telecommunications Terminal Equipment (Amendment) Regulations 2003 (S.I. 2003/1903), regs. 1, 2(11)

PART IV ENFORCEMENT

Enforcement Notices
18 (1) Subject to paragraphs (2) and (5), Schedule 9 shall have effect for the purposes of providing for the enforcement of these Regulations and for matters incidental thereto.
Words in reg. 18(1) substituted (25.7.2003) by The Radio Equipment and Telecommunications Terminal Equipment (Amendment) Regulations 2003 (S.I. 2003/1903), regs. 1, 2(12)(a)
(2) Except in the case of apparatus which, in the opinion of an enforcement authority, is liable to endanger the safety of persons and, where appropriate, of property, where an enforcement authority has reasonable grounds for suspecting that the CE marking has been affixed to apparatus in relation to which any provision of these Regulations has not been complied with, it may serve notice in writing on—
(a) the manufacturer of the apparatus or his authorised representative established within the European Union; or
(b) in a case where neither the manufacturer of the apparatus nor his authorised representative established within the European Union has placed the apparatus on the market, the person who places it on the market in the United Kingdom;
and subject to paragraph (3), no other action pursuant to Schedule 9 may be taken in respect of apparatus until such notice has been given and the person to whom it is given has failed to comply with its requirements.
(3) Notwithstanding the provisions of paragraph (2), for the purpose of ascertaining whether or not the CE marking has been correctly affixed, action may be taken pursuant to paragraph 8 of Schedule 9.
Words in reg. 18(3) substituted (29.12.2003) by The Radio Equipment and Telecommunications Terminal Equipment (Amendment No. 2) Regulations 2003 (S.I. 2003/3144), regs. 1, 2(6)(a)
(4) A notice which is given under paragraph (2) shall—
(a) state that the enforcement authority suspects that the CE marking has not been correctly affixed to the apparatus;
(b) specify the respect in which it is so suspected and give particulars thereof;
(c) require the person to whom the notice is given—
(i) to secure that any apparatus to which the notice relates conforms as regards the provisions concerning the correct affixation of the CE marking within such period as may be specified in the notice; or
(ii) to provide evidence within that period, to the satisfaction of the enforcement authority, that the CE marking has been correctly affixed; and
(d) warn that person that if the non-conformity continues after, or if satisfactory evidence has not been provided within, the period specified in the notice, further action may be taken under the Regulations in respect of that apparatus or apparatus of the same type placed on the market by that person.
(5) sections 94–97 and section 98(1)–(3) of the Communications Act 2003 shall apply for the purposes of the enforcement of regulations 7 and 13 above as if the requirements in those regulations were conditions set under section 45 of that Act.
Reg. 18(5) inserted (25.7.2003) by The Radio Equipment and Telecommunications Terminal Equipment (Amendment) Regulations 2003 (S.I. 2003/1903), regs. 1, 2(12)(b)
Words in reg. 18(5) inserted (29.12.2003) by The Radio Equipment and Telecommunications Terminal Equipment (Amendment No. 2) Regulations 2003 (S.I. 2003/3144), regs. 1, 2(6)(b)

Duty of enforcement authority to inform Secretary of State of action taken
18A. An enforcement authority shall, where action has been taken by it to prohibit or restrict the supply or taking into service (whether under these Regulations or otherwise) of any relevant apparatus, forthwith inform the Secretary of State of the action taken, and the reasons for it, with a view to this information being passed by her to the Commission.
Reg. 18A inserted (29.12.2003) by The Radio Equipment and Telecommunications Terminal Equipment (Amendment No. 2) Regulations 2003 (S.I. 2003/3144), regs. 1, 2(7)

Offences
19. (1) Any person who—
(a) (subject to paragraph (2)) contravenes or fails to comply with regulation 5(1) or 12; or
Words in reg. 19(1)(a) inserted (25.7.2003) by The Radio Equipment and Telecommunications Terminal Equipment (Amendment) Regulations 2003 (S.I. 2003/1903), regs. 1, 2(13)(b)
(b) fails to supply or retain a copy of the appropriate documentation as required by regulation 9(3),
shall be guilty of an offence.
Reg. 19 renumbered as reg. 19(1) (25.7.2003) by virtue of The Radio Equipment and Telecommunications Terminal Equipment (Amendment) Regulations 2003 (S.I. 2003/1903), regs. 1, 2(13)(a)
(2) No offence shall be committed merely by reason of failure to comply with regulation 12 in respect of equipment which uses frequency bands the use of which by that equipment is consistent with the United Kingdom Plan for Frequency Authorisation published under section 153 of the Communications Act 2003.
Reg. 19(2) inserted (25.7.2003) by The Radio Equipment and Telecommunications Terminal Equipment (Amendment) Regulations 2003 (S.I. 2003/1903), regs. 1, 2(13)(c)

Penalties
20. (1) A person guilty of an offence under regulation 19(a) shall be liable on summary conviction—
(a) to imprisonment for a term not exceeding 3 months; or
(b) to a fine not exceeding level 5 on the standard scale,
or to both.
(2) A person guilty of an offence under regulation 19(b) shall be liable on summary conviction to a fine not exceeding level 5 on the standard scale.

Defence of due diligence
21. (1) Subject to the following provisions of this regulation, in proceedings against any person for an offence under regulation 19 or paragraph 11(1) of Schedule 9 above it shall be a defence for that person to show that he took all reasonable steps and exercised all due diligence to avoid committing the offence.
Words in reg. 21(1) inserted (29.12.2003) by The Radio Equipment and Telecommunications Terminal Equipment (Amendment No. 2) Regulations 2003 (S.I. 2003/3144), regs. 1, 2(8)
(2) Where in any proceedings against any person for such an offence the defence provided in paragraph (1) involves an allegation that the commission of the offence was due—
(a) to the act or default of another; or
(b) to reliance on information given by another,
that person shall not, without the leave of the court, be entitled to rely on the defence unless, not less than seven clear days before the hearing of the proceedings (or, in Scotland, the trial diet), he has served a notice under paragraph (3) on the person bringing the proceedings.
(3) A notice under this paragraph shall give such information identifying or assisting in the identification of the person who committed the act or default or gave the information as is in the possession of the person serving the notice at the time he serves it.
(4) It is hereby declared that a person shall not be entitled to rely on the defence provided in paragraph (1) by reason of his reliance on information supplied by another, unless he shows that it was reasonable in all the circumstances for him to have relied on the information, having regard in particular—
(a) to the steps which he took, and those which might reasonably have been taken, for the purpose of verifying the information; and
(b) to whether he had any reason to disbelieve the information.

Liability of persons other than the principal offender
22. (1) Where the commission by any person of an offence under regulation 19 or paragraph 11(1) of Schedule 9 is due to the act or default committed by some other person in the course of any business of his, the other person shall be guilty of the offence and may be proceeded against and punished by virtue of this paragraph whether or not proceedings are taken against the first-mentioned person.
Words in reg. 22(1) inserted (29.12.2003) by The Radio Equipment and Telecommunications Terminal Equipment (Amendment No. 2) Regulations 2003 (S.I. 2003/3144), regs. 1, 2(9)
(2) Where a body corporate is guilty of an offence under these Regulations (including where it is so guilty by virtue of paragraph (1)) in respect of any act or default which is shown to have been committed with the consent or connivance of, or to be attributable to any neglect on the part of, any director, manager, secretary or other similar officer of the body corporate or any person who was purporting to act in any such capacity he, as well as the body corporate, shall be guilty of that offence and shall be liable to be proceeded against and punished accordingly.
(3) Where the affairs of a body corporate are managed by its members, paragraph (2) shall apply in relation to the acts and defaults of a member in connection with his functions of management as if he were a director of the body corporate.
(4) In this regulation, references to a “body corporate” include references to a partnership in Scotland and, in relation to such partnership, any reference to a director, manager, secretary or other similar officer of a body corporate is a reference to a partner.

Savings for action taken under other enactments
23. Nothing in these Regulations shall be construed as preventing the taking of any action in respect of any relevant apparatus under the provisions of any other enactment.
Patricia Hewitt,
Minister for Small Business and E-Commerce,
Department of Trade and Industry
9th March 2000

SCHEDULE 1 (Annex 1 of Directive 99/5/EC)
Regulations 2(3) and 3(5)

EQUIPMENT NOT COVERED BY THIS DIRECTIVE AS REFERRED TO IN ARTICLE 1(4)
1. Radio equipment used by radio amateurs within Article 1, definition 53, of the International Telecommunications Union (ITU) radio regulations unless that equipment is available commercially.
Kits of components to be assembled by radio amateurs and commercial equipment modified by and for the use of radio amateurs are not regarded as commercially available equipment.
2. Equipment falling within the scope of Council Directive 96/98EC of 20 December 1996 on marine equipment.
OJL No. 46, 17.2.1997, p 25.
3. Cabling and wiring.
4. Receive only radio equipment intended to be used solely for the reception of sound and TV broadcasting services.
5. Products, appliances and components within the meaning of Article 2 of Council Regulation (EEC) No. 3922/91 of 16 December 1991 on the harmonisation of technical requirements and administrative procedure in the field of civil aviation.
OJL No. 373, 31.12.1991, p 4 Regulation as amended by Commission Regulation (EC) No. 2176/96 (OJL 291, 14.11.1996, p 15).
6. Air-traffic management equipment and systems within the meaning of Article 1 of Council Directive 93/65EEC of 19 July 1993 on the definition and use of compatible technical specifications for the procurement of air-traffic management equipment and systems.
OJL No. 189, 29.7.1993, p 52 Directive as last amended by Commission Directive 97/15/EC (OJL 95, 10.4.1997, p 16).

SCHEDULE 2 (Annex II of Directive 99/5/EC)
Regulations 2(3), 5(2)(e) and 9(1)

CONFORMITY ASSESSMENT PROCEDURE REFERRED TO IN ARTICLE 10(3)

Module A (internal production control)
1. This module describes the procedure whereby the manufacturer or his authorised representative established within the European Union, who carries out the obligations laid down in point 2, ensures and declares that the products concerned satisfy the requirements of this Directive that apply to them. The manufacturer or his authorised representative established within the European Union must affix the CE marking to each product and draw up a written declaration of conformity.
2. The manufacturer must establish the technical documentation described in point 4 and he or his authorised representative established within the European Union must keep it for a period ending at least 10 years after the last product has been manufactured at the disposal of the relevant national authorities of any Member State for inspection purposes.
3. Where neither the manufacturer nor his authorised representative is established within the European Union, the obligation to keep the technical documentation available is the responsibility of the person who places the product on the Community market.
4. The technical documentation must enable the conformity of the product with the essential requirements to be assessed. It must cover the design, manufacture and operation of the product, in particular:
a general description of the product;
conceptual design and manufacturing drawings and schemes of components, sub-assemblies, circuits, etc.;
descriptions and explanations necessary for the understanding of said drawings and schemes and the operation of the product;
a list of the standards referred to in Article 5, applied in full or in part, and descriptions and explanations of the solutions adopted to meet the essential requirements of the Directive where such standards referred to in Article 5 have not been applied or do not exist;
results of design calculations made, examinations carried out, etc.;
test reports.
5. The manufacturer or his authorised representative must keep a copy of the declaration of conformity with the technical documentation.
6. The manufacturer must take all measures necessary in order that the manufacturing process ensures compliance of the manufactured products with the technical documentation referred to in point 2 and with the requirements of this Directive that apply to them.

SCHEDULE 3 (Annex III of Directive 99/5/EC)
Regulations 2(3), 5(2)(e),9(1) and 10(2)

CONFORMITY ASSESSMENT PROCEDURE REFERRED TO IN ARTICLE 10(4)

(Internal production control plus specific apparatus tests).
This Annex consists of Annex II, plus the following supplementary requirement:
For each type of apparatus, all essential radio test suites must be carried out by the manufacturer or on his behalf. The identification of the test suites that are considered to be essential is the responsibility of a notified body chosen by the manufacturer except where the test suites are defined in the harmonised standards. The notified body must take due account of previous decisions made by notified bodies acting together.
The manufacturer or his authorised representative established within the European Union or the person responsible for placing the apparatus on the market must declare that these tests have been carried out and that the apparatus complies with the essential requirements and must affix the notified body’s identification number during the manufacturing process.

SCHEDULE 4 (Annex IV of Directive 99/5/EC)
Regulations 2(3), 5(2)(e),9(1) and 10(2)

CONFORMITY ASSESSMENT PROCEDURE REFERRED TO INARTICLE 10(5)

(Technical construction file).
This Annex consists of Annex III plus the following supplementary requirements:
The technical documentation described in point 4 of Annex II and the declaration of conformity to specific radio test suites described in Annex III must form a technical construction file.
The manufacturer, his authorised representative established within the European Union or the person responsible for placing the apparatus on the market, must present the file to one or more notified bodies, each of the notified bodies must be informed of others who have received the file.
The notified body must review the file and if it is considered that it has not been properly demonstrated that the requirements of the Directive have been met, the notified body may issue an opinion to the manufacturer, his representative or the person responsible for placing the apparatus on the market and must inform the other notified bodies who have received the file accordingly. Such an opinion must be given within four weeks of receipt of the file by the notified body. On receipt of this opinion, or after the end of the four-week period, the apparatus may be placed on the market, without prejudice to Articles 6(4) and 9(5).
The manufacturer or his authorised representative established within the European Union or the person responsible for placing the apparatus on the market must keep the file for a period ending at least 10 years after the last apparatus has been manufactured at the disposal of the relevant national authorities of any Member States for inspection.

SCHEDULE 5 (Annex V of Directive 99/5/EC)
Regulations 2(3), 5(1) 9(1) and 10(2)

CONFORMITY ASSESSMENT PROCEDURE REFERRED TO IN ARTICLE 10

Full quality assurance
1. Full quality assurance is the procedure whereby the manufacturer who satisfies the obligations of point 2 ensures and declares that the products concerned satisfy the requirements of the Directive that apply to them. The manufacturer must affix the marks referred to in Article 12(1) to each product and draw up a written declaration of conformity.
2. The manufacturer must operate an approved quality system for design, manufacture and final product inspection and testing as specified in point 3 and must be subject to surveillance as specified in point 4.
3. Quality system.
3.1. The manufacturer must lodge an application for assessment of his quality system with a notified body. The application must include:
all relevant information for the products envisaged,
the quality system’s documentation.
3.2 The quality system must ensure compliance of the products with the requirements of the Directive that apply to them. All the elements, requirements and provisions adoped by the manufacturer must be documented in a systematic and orderly manner in the form of written policies, procedures and instructions. This quality system documentation must ensure a common understanding of the quality policies and procedures such as quality programmes, plans, manuals and records.
It must contain in particular an adequate description of :
the quality objectives and the organisational structure, responsibilities and powers of the management with regard to design and product quality,
the technical specifications, including the harmonised standards and technical regulations as well as relevant test specifications that will be applied and, where the standards referred to in Article 5(1) will not be applied in full, the means that will be used to ensure that the essential requirements of the Directive that apply to the products will be met,
the design control and design verification techniques, processes and systematic actions that will be used when designing the products pertaining to the product category covered,
the corresponding manufacturing, quality control and quality assurance techniques, processes and systematic actions that will be used,
the examinations and test that will be carried out before, during and after manufacture, and the frequency with which they will be carried out, as well as the results of the tests carried out before manufacture where appropriate,
the means by which it is ensured that the test and examination facilities respect the appropriate requirements for the performance of the necessary test,
the quality records, such as inspection reports and test data, calibration data, qualification reports of the personnel concerned, etc.,
the means to monitor the achievement of the required design and product quality and the effective operation of the quality system.
3.3 The notified body must assess the quality system to determine whether it satisfies the requirements referred to in point 3.2. It must presume compliance with these requirements in respect of quality systems that implement the relevant harmonised standard.
The notified body must assess in particular whether the quality control system ensures conformity of the products with the requirements of the Directive in the light of the relevant documentation supplied in respect of points 3.1 and 3.2 including, where relevant, test results supplied by the manufacturer.
The auditing team must have at least one member experienced as an assessor in the product technology concerned. The evaluation procedure must include an assessment visit to the manufacturer’s premises.
The decision must be notified to the manufacturer. The notification must contain the conclusions of the examination and the reasoned assessment decision.
3.4 The manufacturer must undertake to fulfil the obligations arising out of the quality system as approved and to uphold it so that it remains adequate and efficient.
The manufacturer or his authorised representative must keep the notified body that has approved the quality system informed of any intended updating of the quality system.
The notified body must evaluate the modifications proposed and decide whether the amended quality system will still satisfy the requirements referred to in point 3.2 or whether a reassessment is required.
It must notify its decision to the manufacturer. The notification must contain the conclusions of the examination and the reasoned assessment decision.
4. EC surveillance under the responsibility of the notified body.
4.1. The purpose of surveillance is to make sure that the manufacturer duly fulfils the obligations arising out of the approved quality system.
4.2. The manufacturer must allow the notified body access for inspection purposes to the locations of design, manufacture, inspection and testing, and storage and must provide it with all necessary information, in particular:
the quality system documentation,
the quality records as foreseen by the design part of the quality system, such as results of analyses, calculations, tests, etc.,
the quality records as foreseen by the manufacturing part of the quality system, such as inspection reports and test data, calibration data, qualification reports of the personnel concerned, etc.
4.3 The notified body must carry out audits at reasonable intervals to make sure that the manufacturer maintains and applies the quality system and must provide an audit report to the manufacturer.
4.4. Additionally, the notified body may pay unexpected visits to the manufacturer. At the time of such visits, the notified body may carry out tests or have them carried out in order to check the proper functioning of the quality system where necessary; it must provide the manufacturer with a visit report and, if a test has been carried out, with a test report.
5. The manufacturer must, for a period ending at least 10 years after the last product has been manufactured, keep at the disposal of the national authorities:
the documentation referred to in the second indent of point 3.1,
the updating referred to in the second paragraph of point 3.4,
the decisions and reports from the notified body which are referred to in the final paragraph of point 3.4 and in points 4.3 and 4.4.
6. Each notified body must make available to the other notified bodies the relevant information concerning quality system approvals including reference to the product(s) concerned, issued and withdrawn.

SCHEDULE 6 (Annex VI of Directive 99/5/EC)
Regulations 2(3) and 15

MINIMUM CRITERIA TO BE TAKEN INTO ACCOUNT WHEN DESIGNATING NOTIFIED BODIES IN ACCORDANCE WITH ARTICLE 11(1)
1. The notified body, its director and the staff responsible for carrying out the tasks for which the notified body has been designated must not be a designer, manufacturer, supplier or installer of radio equipment or telecommunications terminal equipment, or a network operator or a service provider, nor the authorized representative of any of such parties. They must be independent and not become directly involved in the design, construction, marketing or maintenance of radio equipment or telecommunications terminal equipment, nor represent the parties engaged in these activities. This does not preclude the possibility of exchanges of technical information between the manufacturer and the notified body.
2. The notified body and its staff must carry out the tasks for which the notified body has been designated with the highest degree of professional integrity and technical competence and must be free from all pressures and inducements, particularly financial, which might influence their judgement or the results of any inspection, especially from persons or groups of persons with an interest in such results.
3. The notified body must have at its disposal the necessary staff and facilities to enable it to perform properly the administrative and technical work associated with the tasks for which it has been designated.
4. The staff responsible for inspections must have:
sound technical and professional training,
satisfactory knowledge of the requirements of the tests or inspections that are carried out and adequate experience of such tests or inspections,
the ability to draw up the certificates, records and reports required to authenticate the performance of the inspections.
5. The impartiality of inspection staff must be guaranteed. Their remuneration must not depend on the number of tests or inspections carried out nor on the results of such inspections.
6. The notified body must take out liability insurance unless its liability is assumed by the Member State in accordance with national law, or the Member State itself is directly responsible.
7. The staff of the notified body is bound to observe professional secrecy with regard to all information gained in carrying out its tasks (except vis-à-vis the competent administrative authorities of the United Kingdom) under the Directive or any provision of national law giving effect thereto.

SCHEDULE 7 (Annex VII of Directive 99/5/EC)
Regulations 2(3), 5(2)(d) and 10

THE CE MARK
1. The CE conformity marking must consist of the initials `CE' taking the following form:
If the CE marking is reduced or enlarged, the proportions given in the above graduated drawing must be respected.
2. The CE marking must have a height of at least 5 mm except where this is not possible on account of the nature of the apparatus.
3. The CE marking must be affixed to the product or to its data plate. Additionally it must be affixed to the packaging, if any, and to the accompanying documents.
4. The CE marking must be affixed visibly, legibly and indelibly.
5. The equipment class identifier must take a form to be decided by the Commission in accordance with the procedure laid down in Article 14.
Where appropriate it must include an element intended to provide information to the user that the apparatus makes use of radio frequency bands where their use is not harmonised throughout the European Union.
It must have the same height as the initials “CE”.
SCHEDULE 8
Regulation 17

PART I SUBSTITUTE DEFINITIONS
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

PART II SUBSTITUTE CONDITIONS IN THE STANDARD SCHEDULES
Condition 5

Connection of Systems and Apparatus
5.1 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5.2 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5.3 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5.4 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5.5 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5.6 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

PUBLICATION OF INTERFACES
Condition 15

Publication of Commonly Provided Interfaces
15.1 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Publication of new Commonly Provided Interfaces
15.2 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
15.3 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Modifications of Commonly Provided Interface Specifications
15.4 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Withdrawals of Commonly Provided Interfaces
15.5 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Publication Requirements
15.6 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Amendments of Interface Specifications directed by the Director
15.7 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
15.8 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
15.9 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

PART III OTHER SUBSTITUTE CONDITIONS
TECHNICAL REQUIREMENTS
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

APPROVAL OF EQUIPMENT
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Sch. 8 revoked (25.7.2003) by The Radio Equipment and Telecommunications Terminal Equipment (Amendment) Regulations 2003 (S.I. 2003/1903), regs. 1, 2(14)

SCHEDULE 9 ENFORCEMENT
Regulation 18
PART I

Enforcement authorities
1. It shall be the duty of the following authorities to enforce these Regulations:
(1) in Great Britain:
(a) OFCOM, insofar as action taken to enforce a regulation relates to the protection and management of the radio spectrum; and
(b) a local weights and measures authority within their area; and
(2) in Northern Ireland:
(a) OFCOM, insofar as action taken to enforce a regulation relates to the protection and management of the radio spectrum; and
(b) the district councils within their area.

2. The Secretary of State may enforce these Regulations.

3. In this Schedule—
“Local weights and measures authority” has the meaning given by section 69 of the Weights and Measures Act 1985.

4. Nothing in these Regulations shall authorise any enforcement authority to bring proceedings in Scotland for an offence.
PART II

Enforcement in Great Britain
5. Suspension notices
(1) Where an enforcement authority has reasonable grounds for suspecting that any regulation has been contravened in relation to any apparatus, the authority may serve a notice (“a suspension notice”) prohibiting the person on whom it is served, for such period ending not more than six months after the date of the notice as is specified therein, from doing any of the following things without the consent of the authority, that is to say, supplying the apparatus, offering to supply it, agreeing to supply it or exposing it for supply.
(2) A suspension notice served by an enforcement authority in respect of any apparatus shall—
(a) describe the apparatus in a manner sufficient to identify it;
(b) set out the grounds on which the authority suspects that a regulation has been contravened in relation to the apparatus; and
(c) state that, and the manner in which, the person on whom the notice is served may appeal against the notice under paragraph 6 below.
(3) A suspension notice served by an enforcement authority for the purpose of prohibiting a person for any period from doing the things mentioned in sub-paragraph (1) above in relation to any apparatus may also require that person to keep the authority informed of the whereabouts throughout that period of any of the apparatus in which he has an interest.
(4) Where a suspension notice has been served on any person in respect of any apparatus, no further such notice shall be served on that person in respect of the same apparatus unless—
(a) proceedings against that person for an offence in respect of a contravention in relation to the apparatus of a regulation (not being an offence under this sub-paragraph); or
(b) proceedings for the forfeiture of the apparatus under paragraph 21 or 22 below,
are pending at the end of the period specified in the first-mentioned notice.
(5) A consent given by an enforcement authority for the purposes of sub-paragraph (1) above may impose such conditions on the doing of anything for which the consent is required as the authority considers appropriate.
(6) Any person who contravenes a suspension notice shall be guilty of an offence and liable on summary conviction to imprisonment for a term not exceeding three months or to a fine not exceeding level 5 on the standard scale or to both.
(7) Where an enforcement authority serves a suspension notice in respect of any apparatus, the authority shall be liable to pay compensation to any person having an interest in the apparatus in respect of any loss or damage caused by reason of the service of the notice if—
(a) there has been no contravention in relation to the apparatus of any regulation; and
(b) the exercise of the power is not attributable to any neglect or default by that person.
(8) Any disputed question as to the right to or the amount of any compensation payable under this paragraph shall be determined by arbitration or, in Scotland, by a single arbiter appointed, failing agreement between the parties, by the sheriff.

6. Appeals against suspension notices
(1) Any person having an interest in any apparatus in respect of which a suspension notice is for the time being in force may apply for an order setting aside the notice.
(2) An application under this paragraph may be made—
(a) to any magistrates' court in which proceedings have been brought in England and Wales or Northern Ireland—
(i) for an offence in respect of a contravention in relation to the apparatus of any regulation; or
(ii) for the forfeiture of the apparatus under paragraph 21 below;
(b) where no such proceedings have been so brought, by way of complaint to a magistrates' court; or
(c) in Scotland, by summary application to the sheriff.
(3) On an application under this paragraph to a magistrates' court in England and Wales or Northern Ireland the court shall make an order setting aside the suspension notice only if the court is satisfied that there has been no contravention in relation to the apparatus of any regulation.
(4) On an application under this paragraph to the sheriff he shall make an order setting aside the suspension notice only if he is satisfied that at the date of making the order—
(a) proceedings for an offence in respect of a contravention in relation to the apparatus of any regulation; or
(b) proceedings for the forfeiture of the apparatus under paragraph 22 below,
have not been brought or, having been brought, have been concluded.
(5) Any person aggrieved by an order made under this paragraph by a magistrates' court in England and Wales or Northern Ireland, or by a decision of such a court not to make such an order, may appeal against that order or decision—
(a) in England and Wales, to the Crown Court;
(b) in Northern Ireland, to the county court;
and an order so made may contain such provision as appears to the court to be appropriate for delaying the coming into force of the order pending the making and determination of any appeal (including any application under section 111 of the Magistrates' Courts Act 1980 or Article 146 of the Magistrates' Courts (Northern Ireland) Order 1981 (statement of case)).

7. Test purchases
(1) OFCOM shall have power, for the purpose of ascertaining whether any regulation has been contravened in relation to any apparatus to make, or to authorise an officer of OFCOM to make, any purchase of any apparatus.
Word in Sch. 9 para. 7 substituted (1.10.2015) by The Consumer Rights Act 2015 (Commencement No. 3, Transitional Provisions, Savings and Consequential Amendments) Order 2015 (S.I. 2015/1630), art. 1, Sch. 2 para. 34(2)(a)
Word in Sch. 9 para. 7 substituted (1.10.2015) by The Consumer Rights Act 2015 (Commencement No. 3, Transitional Provisions, Savings and Consequential Amendments) Order 2015 (S.I. 2015/1630), art. 1, Sch. 2 para. 34(2)(b)
(2) Where—
(a) any apparatus purchased under this paragraph by or on behalf of OFCOM is submitted to a test; and
(b) the test leads to—
(i) the bringing of proceedings for an offence in respect of a contravention in relation to the apparatus of any regulation or for the forfeiture of the apparatus under paragraph 21 or 22 below; or
(ii) the serving of a suspension notice in respect of any apparatus; and
(c) OFCOM is requested to do so and it is practicable for OFCOM to comply with the request,
OFCOM shall allow the person from whom the apparatus was purchased or any person who is a party to the proceedings or has an interest in any apparatus to which the notice relates to have the apparatus tested.

8. Powers of search etc
(1) Subject to the following provisions of this Part, a duly authorised officer of OFCOM may at any reasonable hour and on production, if required, of his credentials exercise any of the powers conferred by the following provisions of this paragraph.
Word in Sch. 9 para. 8 substituted (1.10.2015) by The Consumer Rights Act 2015 (Commencement No. 3, Transitional Provisions, Savings and Consequential Amendments) Order 2015 (S.I. 2015/1630), art. 1, Sch. 2 para. 34(2)(a)
(2) The officer may, for the purposes of ascertaining whether there has been any contravention of any regulation, inspect any apparatus and enter any premises other than premises occupied only as a person’s residence.
(3) The officer may, for the purpose of ascertaining whether there has been any contravention of any regulation, examine any procedure (including any arrangements for carrying out a test) connected with the production of any apparatus.
(4) If the officer has reasonable grounds for suspecting that there has been a contravention in relation to any apparatus of any regulation, he may—
(a) for the purpose of ascertaining whether there has been any such contravention, require any person carrying on a business, or employed in connection with a business, to produce any documents or information relating to the business;
(b) for the purpose of ascertaining (by testing or otherwise) whether there has been any such contravention, seize and detain the apparatus;
(c) take copies of, or any entry in, any records produced by virtue of sub-paragraph (a) above.
(5) The officer may seize and detain—
(a) any apparatus or records which he has reasonable grounds for believing may be required as evidence in proceedings for an offence in respect of a contravention of any regulation;
(b) any apparatus which he has reasonable grounds for suspecting may be liable to be forfeited under paragraph 21 or 22 below.
(6) If and to the extent that it is reasonably necessary to do so to prevent a contravention of any regulation, the officer may, for the purpose of exercising his power under sub-paragraph (4) or (5) above to seize any apparatus or documents or information—
(a) require any person having authority to do so to open any container; and
(b) himself open or break open any such container where a requirement made under sub-paragraph (a) above in relation to the container has not been complied with.

9. Provisions supplemental to paragraph 8
(1) An officer seizing any apparatus or records under paragraph 8 above shall inform the following persons that the apparatus or documents or information have been so seized, that is to say—
(a) the person from whom they are seized; and
(b) in the case of imported apparatus seized on any premises under the control of the Commissioners of Customs and Excise, the importer of the apparatus (within the meaning of the Customs and Excise Management Act 1979).
(2) If a justice of the peace—
(a) is satisfied by any written information on oath that there are reasonable grounds for believing either—
(i) that any apparatus or documents or information which any officer has power to inspect under paragraph 8 above are on any premises and that their inspection is likely to disclose evidence that there has been a contravention of any regulation; or
(ii) that such a contravention has taken place, is taking place or is about to take place on any premises; and
(b) is also satisfied by any such information either—
(i) that admission to the premises has been or is likely to be refused and that notice of intention to apply for a warrant under this sub-paragraph has been given to the occupier; or
(ii) that an application for admission, or the giving of such a notice, would defeat the object of the entry or that the premises are unoccupied or that the occupier is temporarily absent and it might defeat the object of the entry to await his return,
the justice may by warrant under his hand, which shall continue in force for a period of one month, authorise any officer of OFCOM to enter the premises, if need be by force.
Word in Sch. 9 para. 9 substituted (1.10.2015) by The Consumer Rights Act 2015 (Commencement No. 3, Transitional Provisions, Savings and Consequential Amendments) Order 2015 (S.I. 2015/1630), art. 1, Sch. 2 para. 34(2)(a)
(3) An officer entering any premises by virtue of paragraph 8 above or a warrant under sub-paragraph (2) above may take with him such other persons and such equipment as may appear to him necessary.
(4) On leaving any premises which a person is authorised to enter by a warrant under sub-paragraph (2) above, that person shall, if the premises are unoccupied or the occupier is temporarily absent, leave the premises as effectively secured against trespassers as he found them.
(5) If any person who is not an officer of OFCOM purports to act as such under paragraph 8 or this paragraph he shall be guilty of an offence and liable on summary conviction to a fine not exceeding level 5 on the standard scale.
(6) Where any apparatus seized by an officer under paragraph 8 above is submitted to a test, the officer shall inform the persons mentioned in sub-paragraph (1) above of the result of the test and, if—
(a) proceedings are brought for an offence in respect of a contravention in relation to the apparatus of any regulation or for the forfeiture of the apparatus under paragraph 21 or 22, or a suspension notice is served in respect of any apparatus; and
(b) the officer is requested to do so and it is practicable to comply with the request,
the officer shall allow any person who is a party to the proceedings or, as the case may be, has an interest in the apparatus to which the notice relates to have the apparatus tested.
(7) In the application of this paragraph to Scotland, the reference in sub-paragraph (2) above to a justice of the peace shall include a reference to a sheriff and the references to written information on oath shall be construed as references to evidence on oath.
(8) In the application of this paragraph to Northern Ireland, the references in sub-paragraph (2) above to any information on oath shall be construed as references to any complaint on oath.

10. Power of customs officer to detain apparatus
(1) A customs officer may, for the purpose of facilitating the exercise by an enforcement authority or officer of such an authority of any functions conferred on the authority or officer by or under this Schedule in its application for the purposes of these Regulations, seize any imported apparatus and detain it for not more than two working days.
(2) Anything seized and detained under this paragraph shall be dealt with during the period of its detention in such manner as the Commissioners of Customs and Excise may direct.
(3) In sub-paragraph (1) above the reference to two working days is a reference to a period of forty-eight hours calculated from the time when the apparatus in question is seized but disregarding so much of any period as falls on a Saturday or Sunday or on Christmas Day, Good Friday or a day which is a bank holiday under the Banking and Financial Dealings Act 1971 in the part of the United Kingdom where the apparatus is seized.
(4) In this paragraph and paragraph 11 below “customs officer” means any officer within the meaning of the Customs and Excise Management Act 1979.

11. Obstruction of authorised officer
(1) Subject to regulations 21 and 22 any person who—
(a) intentionally obstructs any officer of OFCOM who is acting in pursuance of any provision of this Part or any customs officer who is so acting; or
Word in Sch. 9 para. 11 substituted (1.10.2015) by The Consumer Rights Act 2015 (Commencement No. 3, Transitional Provisions, Savings and Consequential Amendments) Order 2015 (S.I. 2015/1630), art. 1, Sch. 2 para. 34(3)
(b) intentionally fails to comply with any requirement made of him by any officer of OFCOM under any provision of this Part of this Schedule; or
(c) without reasonable cause fails to give any officer of OFCOM who is so acting any other assistance or information which the officer may reasonably require of him for the purposes of the exercise of the officer’s functions under any provision of this Part of this Schedule,
shall be guilty of an offence and liable on summary conviction to a fine not exceeding level 5 on the standard scale.
(2) A person shall be guilty of an offence if, in giving any information which is required of him by virtue of sub-paragraph (1)(c) above—
(a) he makes any statement which he knows is false in a material particular; or
(b) he recklessly makes a statement which is false in a material particular.
(3) A person guilty of an offence under sub-paragraph (2) above shall be liable—
(a) on conviction on indictment, to a fine;
(b) on summary conviction, to a fine not exceeding the statutory maximum.

12. Appeals against detention of apparatus
(1) Any person having an interest in any apparatus which is for the time being detained under any provision of this Part of this Schedule by OFCOM or by an officer of OFCOM may apply for an order requiring the apparatus to be released to him or to another person.
Words in Sch. 9 para. 12(1) substituted (1.10.2015) by The Consumer Rights Act 2015 (Commencement No. 3, Transitional Provisions, Savings and Consequential Amendments) Order 2015 (S.I. 2015/1630), art. 1, Sch. 2 para. 34(4)
(2) An application under this paragraph may be made—
(a) to any magistrates' court in which proceedings have been brought in England and Wales or Northern Ireland—
(i) for an offence in respect of a contravention in relation to the apparatus of any regulation; or
(ii) for the forfeiture of the apparatus under paragraph 21;
(b) where no such proceedings have been so brought, by way of complaint to a magistrates' court; or
(c) in Scotland, by summary application to the sheriff.
(3) On an application under this paragraph to a magistrates' court or to the sheriff, an order requiring apparatus to be released shall be made only if the court or sheriff is satisfied—
(a) that proceedings—
(i) for an offence in respect of a contravention in relation to the apparatus of any regulation; or
(ii) for the forfeiture of the apparatus under paragraph 21 or 22,
have not been brought or, having been brought, have been concluded without the apparatus being forfeited; and
(b) where no such proceedings have been brought, that more than six months have elapsed since the apparatus was seized.
(4) Any person aggrieved by an order made under this paragraph by a magistrates' court in England and Wales or Northern Ireland, or by a decision of such a court not to make such an order, may appeal against that order or decision—
(a) in England and Wales, to the Crown Court;
(b) in Northern Ireland, to the county court;
and an order so made may contain such provision as appears to the court to be appropriate for delaying the coming into force of the order pending the making and determination of any appeal (including any application under section 111 of the Magistrates' Courts Act 1980 or Article 146 of the Magistrates' Courts (Northern Ireland) Order 1981 (statement of case)).

13. Compensation for seizure and detention
(1) Where an officer of OFCOM exercises any power under paragraph 8 above to seize and detain apparatus, OFCOM shall be liable to pay compensation to any person having an interest in the apparatus in respect of any loss or damage caused by reason of the exercise of the power if—
(a) there has been no contravention in relation to the apparatus of any regulation; and
(b) the exercise of the power is not attributable to any neglect or default by that person.
Words in Sch. 9 para. 13(1) substituted (1.10.2015) by The Consumer Rights Act 2015 (Commencement No. 3, Transitional Provisions, Savings and Consequential Amendments) Order 2015 (S.I. 2015/1630), art. 1, Sch. 2 para. 34(5)
(2) Any disputed question as to the right to or the amount of any compensation payable under this paragraph shall be determined by arbitration or, in Scotland, by a single arbiter appointed, failing agreement between the parties, by the sheriff.

14. Recovery of expenses of enforcement
(1) This paragraph shall apply where a court—
(a) convicts a person of an offence in respect of a contravention in relation to any apparatus of any regulation; or
(b) makes an order under paragraph 21 or 22 for the forfeiture of any apparatus.
(2) The court may (in addition to any other order it may make as to costs or expenses) order the person convicted or, as the case may be, any person having an interest in the apparatus to reimburse an enforcement authority for any expenditure which has been or may be incurred by that authority—
(a) in connection with any seizure or detention of the apparatus by or on behalf of the authority; or
(b) in connection with any compliance by the authority with directions given by the court for the purposes of any order for the forfeiture of the apparatus.

15. Power of Commissioners of Customs and Excise to disclose information
(1) If they think it appropriate to do so for the purpose of facilitating the exercise by any person to whom sub-paragraph (2) below applies of any functions conferred on that person by or under these Regulations, the Commissioners of Customs and Excise may authorise the disclosure to that person of any information obtained for the purposes of the exercise by the Commissioners of their functions in relation to imported apparatus.
(2) This sub-paragraph applies to an enforcement authority and to any officer of an enforcement authority.
(3) A disclosure of information made to any person under sub-paragraph (1) above shall be made in such manner as may be directed by the Commissioners of Customs and Excise and may be made through such persons acting on behalf of that person as may be so directed.
(4) Information may be disclosed to a person under sub-paragraph (1) above whether or not the disclosure of the information has been requested by or on behalf of that person.

16. Service of documents etc
(1) Any document required or authorised by virtue of this Schedule to be served on a person may be so served—
(a) by delivering it to him or by leaving it at his proper address or by sending it by post to him at that address; or
(b) if a person is a body corporate, by serving it in accordance with paragraph (a) above on the secretary or clerk of that body; or
(c) if the person is a partnership, by serving it in accordance with that paragraph on a partner or on a person having control or management of the partnership business.
(2) For the purposes of sub-paragraph (1) above, and for the purposes of section 7 of the Interpretation Act 1978 (which relates to the service of documents by post) in its application to that sub-paragraph, the proper address of any person on whom a document is to be served by virtue of this Schedule shall be his last known address except that—
(a) in the case of service on a body corporate or its secretary or clerk, it shall be the address of the registered or principal office of the body corporate;
(b) in the case of service on a partnership or a partner or a person having the control or management of a partnership business, it shall be the principal office of the partnership;
and for the purposes of this sub-paragraph the principal office of a company registered outside the United Kingdom or of a partnership carrying on business outside the United Kingdom is its principal office within the United Kingdom.

17. Savings for certain privileges
(1) Nothing in this Schedule shall be taken as requiring any person to produce any records if he would be entitled to refuse to produce those records in any proceedings in any court on the grounds that they are the subject of legal professional privilege or, in Scotland, that they contain a confidential communication made by or to an advocate or solicitor in that capacity, or as authorising any person to take possession of any records which are in the possession of a person who would be so entitled.
(2) Nothing in this Schedule shall be construed as requiring a person to answer any question or give any information if to do so would incriminate that person or that person’s spouse.

18. Commencement of proceedings
In England and Wales, a magistrates' court may try an information in respect of an offence committed under these Regulations if the information is laid within twelve months from the time when the offence is committed, and in Scotland summary proceedings for such an offence may be begun at any time within twelve months from the time when the offence is committed.

Enforcement in Northern Ireland
19. The provisions of paragraphs 5 to 17 shall have effect.

20. Commencement of proceedings
A magistrates' court may try a complaint in respect of an offence committed under these Regulations if the complaint is made within twelve months from the time when the offence is committed.

Forfeiture of apparatus: England and Wales and Northern Ireland
21. (1) An enforcement authority in England and Wales or Northern Ireland may apply under this paragraph for an order for the forfeiture of any apparatus on the grounds that there has been a contravention in relation thereto of regulation 5.
(2) An application under this paragraph may be made—
(a) where proceedings have been brought in a magistrates' court in respect of an offence in relation to some or all of the apparatus under regulation 19 to that court; and
(b) where no application for the forfeiture of the apparatus has been made under sub-paragraph (a), by way of complaint to a magistrates' court.
(3) On an application under this paragraph the court shall make an order for the forfeiture of the apparatus if it is satisfied that there has been a contravention in relation thereto of regulation 5.
(4) For the avoidance of doubt it is hereby declared that a court may infer for the purposes of this paragraph that there has been a contravention in relation to any apparatus of regulation 5 if it is satisfied that that regulation has been contravened in relation to any apparatus (whether by reason of being of the same design or part of the same consignment or batch or otherwise).
(5) Any person aggrieved by an order made under this paragraph by a magistrates' court, or by a decision of such court not to make such an order, may appeal against that order or decision—
(a) in England and Wales, to the Crown Court
(b) in Northern Ireland, to the county court,
and an order so made may contain such provision as appears to the court to be appropriate for delaying the coming into force of an order pending the making and determination of any appeal (including any application under paragraph 111 of the Magistrates' Courts Act 1980, or article 146 of the Magistrates' Courts (Northern Ireland) Order 1981 (statement of case)).
(6) Subject to sub-paragraph (7), where any apparatus is forfeited under this paragraph it shall be destroyed in accordance with such directions as the court may give.
(7) On making an order under this paragraph a magistrates' court may, if it considers it appropriate to do so, direct that the apparatus to which the order relates shall (instead of being destroyed) be released, to such person as the court may specify, on condition that that person—
(a) does not supply the apparatus to any person otherwise than—
(i) to a person who carries on a business of buying apparatus of the same description as the first mentioned product and repairing or reconditioning it; or
(ii) as scrap (that is to say, for the value of materials included in the apparatus rather than for the value of the apparatus itself); and
(b) complies with any order to pay costs or expenses which has been made against that person in the proceedings for the order for forfeiture.

Forfeiture of apparatus: Scotland
22. (1) In Scotland a sheriff may make an order for forfeiture of any apparatus for private use or consumption in relation to which there has been a contravention of any provision of regulation 5—
(a) on an application by the procurator-fiscal made in the manner specified in section 134 of the Criminal Procedure (Scotland) Act 1995, or
(b) where a person is convicted of any offence in respect of any such contravention, in addition to any other penalty which the sheriff may impose.
(2) The procurator-fiscal making an application under sub-paragraph (1)(a) shall serve on any person appearing to him to be the owner of, or otherwise to have an interest in, the apparatus to which the application relates a copy of the application, together with a notice giving him the opportunity to appear at the hearing of the application to show cause why the apparatus should not be forfeited.
(3) Service under sub-paragraph (2) shall be carried out, and such service may be proved, in the manner specified for citation of an accused in summary proceedings under the Criminal Procedure (Scotland) Act 1995.
(4) Any person upon whom a notice is served under sub-paragraph (2) and any other person claiming to be the owner of, or otherwise to have an interest in, the apparatus to which an application under this paragraph relates shall be entitled to appear at the hearing of the application to show cause why the apparatus should not be forfeited.
(5) The sheriff shall not make an order following an application under sub-paragraph (1)(a)—
(a) if any person on whom notice is served under sub-paragraph (2) does not appear, unless service of the notice on that person is proved; or
(b) if no notice under sub-paragraph (2) has been served, unless the court is satisfied that in the circumstances it was reasonable not to serve notice on any person.
(6) The sheriff shall make an order under this paragraph only if he is satisfied that there has been a contravention in relation to the apparatus of regulation 5.
(7) For the avoidance of doubt it is declared that the sheriff may infer for the purposes of this paragraph that there has been a contravention in relation to any apparatus of regulation 5 if he is satisfied that that regulation has been contravened in relation to an item of apparatus which is representative of that apparatus (whether by reason of being of the same design or part of the same consignment or batch or otherwise).
(8) Where an order for the forfeiture of any apparatus is made following an application by the procurator-fiscal under sub-paragraph (1)(a), any person who appeared, or was entitled to appear, to show cause why it should not be forfeited may, within twenty-one days of the making of the order, appeal to the High Court by Bill of Suspension on the ground of an alleged miscarriage of justice; and section 182(5)(a) to (e) of the Criminal Procedure (Scotland) Act 1995 shall apply to an appeal under this sub-paragraph as it applies to a stated case under Part X of that Act.
(9) An order following an application under sub-paragraph (1)(a) shall not take effect—
(a) until the end of the period of twenty-one days beginning with the day after the day on which the order was made; or
(b) if an appeal is made under sub-paragraph (8) within that period, until the appeal is determined or abandoned.
(10) An order under sub-paragraph (1)(b) shall not take effect—
(a) until the end of the period within which an appeal against the order could be brought under the Criminal Procedure (Scotland) Act 1995; or
(b) if an appeal is made within that period, until the appeal is determined or abandoned.
(11) Subject to sub-paragraph (12), apparatus forfeited under this paragraph shall be destroyed in accordance with such directions as the sheriff may give.
(12) If he thinks fit, the sheriff may direct the apparatus to be released to such person as he may specify, on condition that that person does not supply it to any person otherwise than—
(a) to a person who carries on a business of buying apparatus of the same description as the first-mentioned apparatus and repairing or re-conditioning it; or
(b) as scrap (that is to say, for the value of material included in the apparatus rather than for the value of the apparatus).
Sch. 9 substituted (29.12.2003) by The Radio Equipment and Telecommunications Terminal Equipment (Amendment No. 2) Regulations 2003 (S.I. 2003/3144), regs. 1, 2(10)

(This note is not part of the Regulations)
These Regulations implement Directive 1999/5/EC of the European Parliament and of the Council on radio equipment and telecommunications terminal equipment and the mutual recognition of their conformity.
Regulation 3 applies the Regulations to all radio or telecommunications terminal equipment (“RTTE equipment”) except for apparatus covered by certain other Directives or Regulations, apparatus used for purposes of public security, defence or criminal enforcement and equipment specified in Schedule 1.
Regulation 4 prescribes the essential requirements that must be satisfied by RTTE equipment.
Regulation 5 prohibits RTTE equipment from being placed on the market or put into service until certain provisions have been complied with, except where it is for export, reprocessing or display at a trade fair (regulation 6), where public telecommunication operators to refuse connection in order to protect the network (regulation 7) or where, during a one-year transitional period, it complies with the provisions being superseded by these Regulations (regulation 8).
Regulations 9 to 13 provide for conformity assessment, CE marking, accompanying information, notices to the Secretary of State and publication of information.
Regulations 14 to 16 provide for notified bodies to carry out conformity assessment and for their fees.
Regulation 17 modifies existing telecommunication licences in compliance with the Directive.
Regulations 18 to 23 provide for enforcement.
A Regulatory Impact Assessment is available and can be obtained from Communications and Information Industries Directorate, Department of Trade and Industry, 151 Buckingham Palace Road, London SW1W 9SS.

Reg. 1 in force at 8.4.2000, see reg. 1(1)
Reg. 2 in force at 8.4.2000, see reg. 1(1)
Reg. 3 in force at 8.4.2000, see reg. 1(1)
Reg. 4 in force at 8.4.2000, see reg. 1(1)
Reg. 5 in force at 8.4.2000, see reg. 1(1)
Reg. 6 in force at 8.4.2000, see reg. 1(1)
Reg. 8 in force at 8.4.2000, see reg. 1(1)
Reg. 9 in force at 8.4.2000, see reg. 1(1)
Reg. 10 in force at 8.4.2000, see reg. 1(1)
Reg. 11 in force at 8.4.2000, see reg. 1(1)
Reg. 12 in force at 8.4.2000, see reg. 1(1)
Reg. 14 in force at 8.4.2000, see reg. 1(1)
Reg. 15 in force at 8.4.2000, see reg. 1(1)
Reg. 16 in force at 8.4.2000, see reg. 1(1)
Reg. 18 in force at 8.4.2000, see reg. 1(1)
Reg. 19 in force at 8.4.2000, see reg. 1(1)
Reg. 20 in force at 8.4.2000, see reg. 1(1)
Reg. 21 in force at 8.4.2000, see reg. 1(1)
Reg. 22 in force at 8.4.2000, see reg. 1(1)
Reg. 23 in force at 8.4.2000, see reg. 1(1)
Sch. 1 in force at 8.4.2000, see reg. 1(1)
Sch. 2 in force at 8.4.2000, see reg. 1(1)
Sch. 3 in force at 8.4.2000, see reg. 1(1)
Sch. 4 in force at 8.4.2000, see reg. 1(1)
Sch. 5 in force at 8.4.2000, see reg. 1(1)
Sch. 6 in force at 8.4.2000, see reg. 1(1)
Sch. 7 in force at 8.4.2000, see reg. 1(1)
Regulations: any reference to “the Director” treated as a reference to OFCOM (with the exception of reg. 13(7)) (29.12.2003) by virtue of The Radio Equipment and Telecommunications Terminal Equipment (Amendment No. 2) Regulations 2003 (S.I. 2003/3144), regs. 1, 2(2)