SCHEDULE 4 CORDLESS TELEPHONE APPARATUS

PART II ADDITIONAL TERMS, PROVISIONS AND LIMITATIONS
Unless there is a Common Technical Regulation in force in respect of the prescribed apparatus, such apparatus must–
(a) be approved for the time being by the Secretary of State under section 84 of the 1984 Act for the purposes of these Regulations;
(b) be approved to the ETSI standards referred to in Part IV of this Schedule as appropriate by a national administration following type testing at a test laboratory; or
(c) comply with the requirements of MPTs 1322, 1334, 1371 and 1384 as appropriate in relation to prescribed apparatus taken into service before section 84 of the 1984 Act came into force,
provided that paragraph (a) above shall not apply in relation to prescribed apparatus situated in the Bailiwick of Jersey.