3 Fees for applications for approval of respiratory protective equipment
1 A fee shall be payable by the applicant to the Executive on each application for approval of respiratory protective equipment–
(a) under the Factories Act 1961, or any regulations made or having effect as if made under that Act;
1961 c. 34.
(b) under the Control of Lead at Work Regulations 1998;
S.I. 1998/543.
(c) under the Ionising Radiations Regulations 1985;
S.I. 1985/1333.
(d) under the Control of Asbestos at Work Regulations 1987; and
S.I. 1987/2115 to which there are amendments not relevant to these Regulations.
(e) under the Control of Substances Hazardous to Health Regulations 1994.
S.I. 1994/3246 to which there are amendments not relevant to these Regulations.
2 The fee payable on application for approval of respiratory protective equipment shall be that specified in column 2 of Schedule 2 (that is to say the reasonable cost to the Executive of having the work, including any testing, carried out).