THE SCHEDULE PART IV The provisions of the principal Regulations specified for the purposes of regulation 23 of these Regulations are as follows—
regulation 20A(2);
regulation 21(4);
regulation 21(5);
regulation 33(1) where the word “him” secondly occurs;
regulation 38(2A).