SCHEDULE 2

METHODS OF ANALYSIS
ANNEX II

METHOD FOR DETERMINING URIC ACID

Scope and Field of Application
1
This method is for the determination of uric acid and its salts in dried poultry waste and in feeding stuffs containing dried poultry waste.