Manner of taking, preparing, marking, sealing and fastening of samples
3
The manner in which samples of feeding stuffs are to be taken, prepared, marked, sealed and fastened shall be as prescribed in paragraphs 1 to 9 of Schedule 1 and paragraph 10 of that Schedule shall have effect for the purposes of the certificate referred to in regulation 7.