12C Water level detectors in dry or void spaces
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Regulations revoked (20.12.2022) by The Merchant Shipping (Additional Safety Measures for Bulk Carriers) Regulations 2022 (S.I. 2022/1218), reg. 1(1), Sch.