THE SCHEDULE AMENDMENTS TO THE CONTROL OF ASBESTOS AT WORK REGULATIONS 1987
2 For paragraph (2) of regulation 2, substitute the following paragraph–

“2 For the purposes of these Regulations, except as specified in regulation 8(2), in determining whether an employee is exposed to asbestos or whether the extent of such exposure exceeds the action level or any control limit, no account shall be taken of any respiratory protective equipment which, for the time being, is being worn by that employee.”

.