SCHEDULE 1

PART 1 COUNCIL REGULATION (EEC) NO. 1768/92 OF 18TH JUNE 1992 CONCERNING THE CREATION OF A SUPPLEMENTARY PROTECTION CERTIFICATE FOR MED ICINAL PRODUCTS

FINAL PROVISION ARTICLE 23

Entry into force
This Regulation shall enter into force six months after its publication in the Official Journal of the European Communities.
This Regulation shall be binding in its entirety and directly applicable in all Member States.
Done at Luxembourg, 18 June 1992.
For the Council
The President
Vitor MARTINS