SCHEDULE THE CHESHIRE FIRE SERVICES COMBINATION SCHEME

PART II GENERAL

3 The combined area
The areas of the following councils, namely the councils of the boroughs of Halton and Warrington and Cheshire County Council shall be combined and shall become the combined area.