1996 No. 797
WEIGHTS AND MEASURES
The Weighing Equipment (Filling and Discontinuous Totalising Automatic Weighing Machines) (Amendment) Regulations 1996
Made 13th March 1996
Laid before Parliament 15th March 1996
Coming into force 29th April 1996

The Secretary of State, in exercise of the powers conferred on him by sections 11(1), (4) and (7), 15(1), 86(1) and 94(1) of the Weights and Measures Act 1985, hereby makes the following Regulations—
1985 c. 72; section 94(1) contains a definition of “prescribed”.