1996 No. 2885
HOUSING, ENGLAND AND WALES
The Housing (Fitness Enforcement Procedures) Order 1996
Made 18th November 1996
Laid before Parliament 26th November 1996
Coming into force 17th December 1996

The Secretary of State for the Environment as respects England, and the Secretary of State for Wales as respects Wales, in exercise of the powers conferred on them by section 86 of the Housing Grants, Construction and Regeneration Act 1996 and all other powers enabling them in that behalf, hereby make the following Order:
1996 c. 53 .