PART II THE GOVERNORS

7 Age limit for governors
A person who has attained the age of 70 years shall not thereafter be eligible to take office, whether for a first or subsequent term, as a governor:
Provided that nothing in this article shall prohibit a person who attains the said age during a term of office as a governor from continuing as a governor until the expiry of that term.