Schedule 1 CONSTRUCTION, LAYOUT AND EQUIPMENT OF SLAUGHTERHOUSES (EXCEPT LOW THROUGHPUT SLAUGHTERHOUSES), CUTTING PREMISES (EXCEPT LOW THROUGHPUT CUTTING PREMISES) AND COLD STORES—GENERAL REQUIREMENTS
4 In rooms used for chilling or refrigerating fresh meat a device with which water may easily be removed is sufficient.