1995 No. 3132
FIRE SERVICES
The Humberside Fire Services (Combination Scheme) Order 1995
Made 4th December 1995
Coming into force 5th December 1995

Whereas it appears to the Secretary of State that it is expedient in the interests of efficiency that a combination scheme should be made for the areas of the fire authorities referred to in paragraph 3 of the scheme set out in the Schedule hereto (“the scheme”), and a scheme has not been submitted to him by those authorities;
And whereas notice of the general nature of the scheme has been given in accordance with section 6(2) of the Fire Services Act 1947 (“the 1947 Act”);
1947 c. 41. Sections 6 and 10 of the 1947 Act were amended respectively by paragraphs 1 and 2 of Schedule 3 to the Local Government Act 1992 (c. 19). For the purposes of making the scheme set out in the Schedule to this Order, sections 5(2) and 10 of the 1947 Act have effect as indicated in article 12 of the Humberside (Structural Change) Order 1995 (S.I. 1995/600).
And whereas the Secretary of State has been notified by the fire authorities concerned of their assent to the scheme;
And whereas a draft of the Order containing the draft scheme has been laid before Parliament for a period of forty days pursuant to section 6 of the Statutory Instruments Act 1946, and that period has expired without either House resolving that the Order be not made;
1946 c. 36.
Now, therefore, in exercise of the powers conferred upon him by sections 6, 8 and 10 of the 1947 Act, and section 7(2) of the Fire Services Act 1959, the Secretary of State hereby makes the following Order:
1959 c. 44.