SCHEDULE PROHIBITED PLACES
PART II The United Kingdom Atomic Energy Authority site at Harwell, Didcot, Oxfordshire, OX11 0RA.
The United Kingdom Atomic Energy Authority site at Windscale, Seascale, Cumbria,CA20 1PF.