SCHEDULE 3

PART I REQUIREMENTS FOR DISCHARGES FROM TREATMENT PLANTS
3 Discharges from urban waste water treatment plants to those sensitive areas which are subject to eutrophication as identified in sub-paragraph (a) of Part I of Schedule 1 shall, subject to paragraphs 4 and 5 of Part II of this Schedule, also meet the requirements in Table 2 below.