1992 No. 450
GAS
The Gas (Metrication) Regulations 1992
Made 28th February 1992
Laid before Parliament 6th March 1992
Coming into force 1st April 1992

The Secretary of State, being a Minister designated for the purposes of section 2(2) of the European Communities Act 1972 in relation to units of measurement to be used for economic, health, safety or administrative purposes, in exercise of the powers conferred by section 2(2) and (4) of the said Act of 1972, and of all other enabling powers, hereby makes the following Regulations:
S.I.1976/897.
1972 c. 68.