2 Interpretation
In these Regulations “the 1981 Order” means the Firearms (Northern Ireland) Order 1981.
S.I.1981/155 (N.I. 2) as extended by S.I.1983/1899 (N.I. 20) and amended by S.I.1989/1338 (N.I. 10).