THE SCHEDULE PRODUCTS CONTAINING CHRYSOTILE WHICH ARE PROHIBITED
10 Textiles finished in the form intended to be supplied to the end user unless treated to avoid fibre release, except that this prohibition shall not apply to diaphragms for electrolysis processes until after 31st December 1998.