9 Extension outside Great Britain
These Regulations shall apply to any premises and activities outside Great Britain to which sections 1 to 59 and 80 to 82 of the Health and Safety at Work etc. Act 1974 apply by virtue of the Health and Safety at Work etc. Act 1974 (Application Outside Great Britain) Order 1989 as they apply to premises and activities within Great Britain.
1974 c. 37.
S.I. 1989/840.