SCHEDULE 2 EQUIPMENT TESTS AND RESERVE POWER CHECKS
3 Monthly
(a) Each EPIRB and satellite EPIRB shall be tested at least once a month to determine its capability to operate properly using the means provided on the device and without using the satellite system.
(b) Each search and rescue radar transponder shall be checked at least once a month for security and signs of damage.
(c) Each survival craft two-way VHF equipment shall be tested at least once a month on a frequency other than 156.8 MHz (VHF Channel 16).
(d) A check shall be made at least once a month on the security and condition of all batteries providing a source of energy for any part of a radio installation. The battery connections and compartment shall also be checked.