SCHEDULE 1 AMENDMENTS TO THE SOFT DRINKS REGULATIONS 1964
Regulation 3
1 In regulation 4(2), for the words “one gallon” there shall be substituted the words “five litres”.
2 In regulation 5(2)(a), for the words “22 1/2 pounds of sugar per 10 gallons” there shall be substituted the words “225 grams of sugar per litre”.
3 In regulation 5(5)—
(a) in sub-paragraph (a), for the words “7.5 calories per fluid ounce” there shall be substituted the words “264 kilocalories per litre and 1105 kilojoules per litre”;
(b) in sub-paragraph (b), for the words “1.5 calories per fluid ounce” there shall be substituted the words “53 kilocalories per litre and 221 kilojoules per litre”.
4 In regulation 10, the second paragraph shall be deleted.
5 For each of the imperial units of measurement referred to in Schedules 2 and 3 to the Regulations and specified in column 1 of the following Table, in each place where they respectively occur in those Schedules, there shall be substituted the corresponding metric unit of measurement in column 2 of the Table
Column 1	Column 2
Imperial Unit of Measurement	Metric Unit of Measurement
Pint	Litre
10 gallons	litre
½ grain	57 mg
5 grains	570 mg
28 grains	40 mg
56 grains	80 mg
80 grains	114 mg
140 grains	200 mg
280 grains	400 mg
1½ lb	15 g
2 lb	20 g
2¼ lb	22.5 g
3 lb	30 g
4½ lb	45 g
7 lb	70 g
10 lb	100 g
11¼ lb	112.5 g
15 lb	150 g
22½ lb	225 g