3 Storage of slurry
1 Subject to paragraph (2), a person having custody or control of slurry shall store it in a slurry storage system in relation to which the requirements of Schedule 2 are satisfied or which is an exempt structure by virtue of regulation 5.
2 Paragraph (1) shall not apply to slurry while it is stored temporarily in a tanker with a capacity not exceeding 18,000 litres which is used for transporting slurry on roads or about a farm.