Limits of jurisdiction
10. On and after the day of transfer the area within which the Company shall exercise jurisdiction as a harbour authority and within which the powers of the Piermaster shall be exercised shall comprise in addition to the transferred harbour the area of water adjacent to, and extending to a distance of 50 metres in every seaward direction from, the transferred harbour.