1990 No. 528
TRIBUNALS AND INQUIRIES
The Electricity Generating Stations and Overhead Lines (Inquiries Procedure) Rules 1990
Made 7th March 1990
Laid before Parliament 9th March 1990
Coming into force 31st March 1990

The Lord Chancellor, in exercise of the powers conferred on him by section 11 of the Tribunals and Inquiries Act 1971, and after consultation with the Council on Tribunals, hereby makes the following rules:—
1971 c. 62