SCHEDULE 1 PROVISIONS APPLYING TO MINES ONLY AND HAVING EFFECT IN PARTICULAR IN RELATION TO THE USE BELOW GROUND IN COAL MINES OF FILM LIGHTING CIRCUITS
Regulation 17
1 In this Schedule, “film lighting circuit” means any electric circuit at a coal mine, not being permanently installed thereat, and required occasionally to supply mains electricity to electric lights for the purpose of providing illumination for photography or video-recording, and includes the said lights and any other electrical apparatus in that circuit.
2 A film lighting circuit shall not be used unless–
(a) not less than 7 days prior to such use, details of when and where it is to be used have been notified to the Health and Safety Executive; and
(b) within the 24 hours immediately preceding such use–
(i) it has been externally examined; and
(ii) the insulation thereof and the conductance of every conductor of every flexible cable forming part of it have been tested.
3 The manager shall make, and ensure the carrying out of, arrangements to prevent the accumulation of dust on any surface of any luminaire or apparatus in sufficient quantities to give rise to spontaneous ignition.
4 The manager shall make suitable rules with respect to the use of film lighting circuits, for the purpose of ensuring, so far as is reasonably practicable, that such use will not give rise to danger; and those rules shall in particular require–
(a) continuous testing for firedamp when a film lighting circuit is in use; and
(b) the operation of any such circuit to be personally supervised by a competent person.
5 No person shall fire any shot or round of shots in a place in which, or in the vicinity of which, any part of a film lighting circuit is installed.

SCHEDULE 2 REVOCATIONS AND MODIFICATIONS
Regulation 33

PART I revocations
Column 1	Column 2	Column 3
Regulations and orders revoked	Reference	Extent of revocation
The Electricity Regulations 1908	S.R. & O. 1908/1312	The whole Regulations
The Manufacture of Cinematograph Film Regulations 1928	S.R. & O. 1928/82	Regulation 12
The Cinematograph Film Stripping Regulations 1939	S.R. & O. 1939/571	Regulation 14
The Electricity (Factories Act) Special Regulations 1944	S.R. & O. 1944/739	The whole Regulations
The Factories (Testing of Aircraft Engines and Accessories) Special Regulations 1952	S.I. 1952/1689	In regulation 2(2), the definitions of “Earthed”, “Flameproof” and “Intrinsically safe”; regulations 14, 15, 16, 17 and 18
The Coal and Other Mines (General Duties and Conduct) Regulations 1956	S.I. 1956/1761	Regulation 6(2)
The Coal and Other Mines (Safety-Lamps and Lighting) Regulations 1956	S.I. 1956/1765	Regulations 4, 18, 18A and 19
The Coal and Other Mines (Electricity) Order 1956	S.I. 1956/1766	The whole Order
The Miscellaneous Mines (Electricity) Order 1956	S.I. 1956/1779	The whole Order
The Quarries (Electricity) Order 1956	S.I. 1956/1781	The whole Order
The Dragonby Ironstone Mine (Diesel, Diesel-Electric and Storage Battery Vehicles) Special Regulations 1958	S.I. 1958/320	The whole Regulations
The Winn’s Ironstone Mine (Diesel, Diesel-Electric and Storage Battery Vehicles) Special Regulations 1958	S.I. 1958/321	The whole Regulations
The Silverwood Mine (Electric Trolley Locomotives) Special Regulations 1958	S.I. 1958/1276	The whole Regulations
The Gasswater A Mine (Storage Battery Locomotives) Special Regulations 1959	S.I. 1959/37	The whole Regulations
The Gasswater B Mine (Storage Battery Locomotives) Special Regulations 1959	S.I. 1959/38	The whole Regulations
The Glass Houghton Mine (Shuttle Cars) Special Regulations 1959	S.I. 1959/663	The whole Regulations
The Heights Mine (Storage Battery Locomotives) Special Regulations 1960	S.I. 1960/223	The whole Regulations
The Coal Mines (Firedamp Drainage) Regulations 1960	S.I. 1960/1015	Regulation 12(1)(b)
The Construction (General Provisions) Regulations 1961	S.I. 1961/1580	Regulation 44
The Hopton Mine (Locomotives and Diesel Vehicles) Special Regulations 1961	S.I. 1961/1583	The whole Regulations
The Cocklakes Mine (Locomotives and Diesel Vehicles) Special Regulations 1961	S.I. 1961/1769	The whole Regulations
The Long Meg Mine (Locomotives and Diesel Vehicles) Special Regulations 1961	S.I. 1961/1774	The whole Regulations
The Sandwith Anhydrite Mine (Lighting) Special Regulations 1962	S.I. 1962/192	The whole Regulations
The Thistleton Mine Special Regulations 1962	S.I. 1962/364	Regulations 4, 22 to 42, and 53 to 80
The Force Crag Mine (Storage Battery Locomotives) Special Regulations 1962	S.I. 1962/1501	The whole Regulations
The Potts Ghyll Mine (Storage Battery Locomotives) Special Regulations 1963	S.I. 1963/270	The whole Regulations
The Chislet Mine (Electric Trolley Locomotives) Special Regulations 1963	S.I. 1963/896	The whole Regulations
The Llanharry Mine (Storage Battery Locomotives) Special Regulations 1963	S.I. 1963/906	The whole Regulations
The Easton Mine (Diesel, Diesel-Electric and Storage Battery Vehicles) Special Regulations 1963	S.I. 1963/1074	The whole Regulations
The Guildie Howes Mine (Locomotives and Diesel Vehicles) Special Regulations 1965	S.I. 1965/33	The whole Regulations
The Muirshiel Barytes Mine (Storage Battery Locomotives) Special Regulations 1965	S.I. 1965/120	The whole Regulations
The Dragonby Ironstone Mine (Diesel, Diesel-Electric and Storage Battery Vehicles) (Amendment) Special Regulations 1965	S.I. 1965/1299	The whole Regulations
The Coal and Other Mines (Mechanics and Electricians) Regulations 1965	S.I. 1965/1559	Regulation 11(3)
The Redburn Mine (Storage Battery Locomotives) Special Regulations 1965	S.I. 1965/1698	The whole Regulations
The Settlingstones Mine (Storage Battery Locomotives) Special Regulations 1966	S.I. 1966/351	The whole Regulations
The Coal and Other Mines (Electricity) (Amendment) Regulations 1967	S.I. 1967/1083	The whole Regulations
The Aberllefeni Mine (Storage Battery Locomotives) Special Regulations 1967	S.I. 1967/1395	The whole Regulations
The Braich Goch Mine (Storage Battery Locomotives) Special Regulations 1967	S.I. 1967/1396	The whole Regulations
The Preston Manor Mine (Lighting) Special Regulations 1968	S.I. 1968/38	The whole Regulations
The Chudleigh Knighton Tunnel Mine (Lighting) Special Regulations 1968	S.I. 1968/39	The whole Regulations
The West Golds Mine (Lighting) Special Regulations 1968	S.I. 1968/40	The whole Regulations
The Broadway New Pit Tunnel Mine (Lighting) Special Regulations 1968	S.I. 1968/103	The whole Regulations
The Mainbow Mine (Lighting) Special Regulations 1968	S.I. 1968/104	The whole Regulations
The Nangiles and the Janes Mine (Storage Battery Locomotives) Special Regulations 1968	S.I. 1968/868	The whole Regulations
The Camborne Mine (Storage Battery Locomotives) Special Regulations 1969	S.I. 1969/570	The whole Regulations
The Cotgrave Mine (Suspended Monorail Diesel Locomotives) Special Regulations 1969	S.I. 1969/744	The whole Regulations
The Levant Mine (Storage Battery Locomotives) Special Regulations 1969	S.I. 1969/1236	The whole Regulations
The No. 4 Adit Mine (Lighting) Special Regulations 1970	S.I. 1970/1103	The whole Regulations
The Rixey Park Mine (Lighting) Special Regulations 1970	S.I. 1970/1547	The whole Regulations
The Horden Mine (Cable Reel Shuttle Cars) Special Regulations 1971	S.I. 1971/18	The whole Regulations
The Mount Wellington Mine (Storage Battery Locomotives) Special Regulations 1971	S.I. 1971/1270	The whole Regulations
The Cornish Hush Mine (Storage Battery Locomotives) Special Regulations 1972	S.I. 1972/348	The whole Regulations
The Beckermet Mine (Storage Battery Locomotives) Special Regulations 1972	S.I. 1972/396	The whole Regulations
The Burtree Pasture Mine (Storage Battery Locomotives) Special Regulations 1972	S.I. 1972/483	The whole Regulations
The Haile Moor Mine (Storage Battery Locomotives) Special Regulations 1972	S.I. 1972/1235	The whole Regulations
The Carrock Fell Mine (Storage Battery Locomotives) Special Regulations 1972	S.I. 1972/1236	The whole Regulations
The Prince of Wales Mine (Storage Battery Locomotives) Special Regulations 1972	S.I. 1972/1393	The whole Regulations
The Rixey Park Mine (Storage Battery Locomotives) Special Regulations 1973	S.I. 1973/1208	The whole Regulations
The Beaumont Mine (Storage Battery Locomotives) Special Regulations 1974	S.I. 1974/1654	The whole Regulations
The Coal and Other Mines (Electricity) (Second Amendment) Regulations 1974	S.I. 1974/1853	The whole Regulations
The Ledston Luck Mine (Cable Reel Shuttle Cars) Special Regulations 1974	S.I. 1974/1929	The whole Regulations
The Factories Act 1961 etc. (Repeals and Modifications) Regulations 1974	S.I. 1974/1941	Regulation 3(2)(a)
The Hendre Mine (Storage Battery Locomotives) Special Regulations 1974	S.I. 1974/1985	The whole Regulations
The Mines and Quarries Acts 1954 to 1971 (Repeals and Modifications) Regulations 1975	S.I. 1975/1102	The entry in Schedule 2 relating to the Coal and Other Mines (Electricity) Regulations 1956
The South Leicester Mine (Electric Lighting) Regulations 1976	S.I. 1976/696	The whole Regulations
The Coal and Other Mines (Electricity) (Third Amendment) Regulations 1977	S.I. 1977/1205	The whole Regulations
The Bolsover Mine (Cable Reel Shuttle Cars) Regulations 1977	S.I. 1977/2035	The whole Regulations
The Ackton Hall Mine (Cable Reel Load-Haul-Dump Vehicles) Regulations 1978	S.I. 1978/1539	The whole Regulations
The Coal and Other Mines (Metrication) Regulations 1978	S.I. 1978/1648	The entries in the Schedule relating to– (a) regulation 18 of the Coal and Other Mines (Safety-Lamps and Lighting) Regulations 1956; and (b) the Coal and Other Mines (Electricity) Regulations 1956
The Coal and Other Mines (Electric Lighting for Filming) Regulations 1979	S.I. 1979/1203	The whole Regulations
The Scraithole Mine (Storage Battery Locomotives) Regulations 1979	S.I. 1979/1658	The whole Regulations
The Lynemouth Mine (Electric Lighting) Regulations 1980	S.I. 1980/1395	The whole Regulations
The Manton Mine (Electric Lighting) Regulations 1980	S.I. 1980/1396	The whole Regulations
The Vane Tempest Mine (Electric Lighting) Regulations 1980	S.I. 1980/1397	The whole Regulations
The Yew Tree Mine (Storage Battery Locomotives) Regulations 1980	S.I. 1980/1405	The whole Regulations
The Coal and Other Mines (Safety-Lamps and Lighting) (Amendment) Regulations 1983	S.I. 1983/710	The whole Regulations
The Miscellaneous Mines (Metrication) Regulations 1983	S.I. 1983/994	In regulation 1(2), the reference to the Miscellaneous Mines (Electricity) Regulations 1956; and in the Schedule the entries relating to those 1956 Regulations
The Quarries (Metrication) Regulations 1983	S.I. 1983/1026	In regulation 1(2), the reference to the Quarries (Electricity) Regulations 1956; and in the Schedule the entries relating to those 1956 Regulations
The Mines (Miscellaneous Amendments) Regulations 1983	S.I. 1983/1130	The whole Regulations

PART II modifications
1 The Mines and Quarries Act 1954 shall be modified as follows–
(a) in section 64(2) (which relates to safety-lamps) after the word “one” insert “conforming with the provisions of regulation 19(2)(a) to (d) of the Electricity at Work Regulations 1989 or”;
(b) in section 182(1) (which defines “permitted lights”) the words “or health and safety regulations” shall be substituted for the words “or Regulations 18 and 18A of the Coal and Other Mines (Safety-Lamps and Lighting) Regulations 1956 as substituted and inserted respectively by the Coal and Other Mines (Safety-Lamps and Lighting) (Amendment) Regulations 1983”.
2 Regulation 4 of the Coal and Other Mines (Fire and Rescue) Regulations 1956 (which relates to the provision of dust or sand in relation to electric motors) shall be modified by substituting the words “which is not electrical apparatus that is designed to be moved while working” for the words “which is not portable apparatus for the purposes of the Coal and Other Mines (Electricity) Regulations 1956”.
S.I. 1956/1768, to which there are amendments not relevant to these Regulations.
3 The Shipbuilding and Ship-repairing Regulations 1960 shall be modified as follows–
(a) in regulation 51(3)(c) (which requires the provision of lamps and torches in confined spaces in vessels) the words “of an appropriate type” shall be substituted for the words “of a safety type approved for the purpose of this Regulation”;
(b) in paragraphs (1) and (3) of regulation 59 (which impose restrictions with respect to the application etc. of naked lights, fires, lamps and heated rivets in oil-carrying vessels), the words “a lamp of an appropriate type” shall be substituted for the words “a safety lamp of a type approved for the purpose of this Regulation” where they respectively appear.
S.I. 1960/1932; the relevant amending instrument is S.I. 1983/644.
4 Section 1(4) of the Mines Management Act 1971 (which relates to exceptions from statutory responsibilities that may be placed on managers' assistants) shall be modified by the substitution of the following paragraphs for paragraph (d)–

“(d) responsibility for making rules under regulation 19(2)(g) of the Electricity at Work Regulations 1989; and
(e) such other responsibilities as may be prescribed.”

.