1989 No. 635
HEALTH AND SAFETY
The Electricity at Work Regulations 1989
Made 7th April 1989
Laid before Parliament 25th April 1989
Coming into force 1st April 1990
The Secretary of State, in exercise of the powers conferred on him by sections 15(1), (2), (3)(a) and (b), (4)(a), (5)(b), (6)(b), (8) and (9) and 82(3)(a) of, and paragraphs 1(1)(a) and (c), (2) and (3), 6(2), 9, 11, 12, 14, 15(1), 16 and 21(b) of Schedule 3 to, the Health and Safety at Work etc. Act 1974 (“the 1974 Act”), and of all other powers enabling him in that behalf and for the purpose of giving effect without modifications to proposals submitted to him by the Health and Safety Commission under section 11(2)(d) of the 1974 Act, after the carrying out by the said Commission of consultations in accordance with section 50(3) of that Act, hereby makes the following Regulations:
1974 c. 37; sections 15 and 50 were amended by the Employment Protection Act 1975 (c. 71), Schedule 15, paragraphs 6 and 16 respectively.