SCHEDULE
Article 2

PART I DESIGNATED OWNERS
Amerada Hess (Norway) Ltd., incorporated in the U.S.A., whose principal office is at 1185 Avenue of the Americas, New York, N.Y. 10036, U.S.A., and whose registered office in Norway is at N-0150 Langkaien 1, Oslo 1, Norway.
Amoco Norway Oil Company, incorporated in the U.S.A., whose principal office is at 200 East Randolph Drive, Chicago, IL 60601, U.S.A., and whose principal place of business in Norway is at Bergjelandsgaten 25, N-4012 Stavanger, Norway.
Britoil p.l.c., whose registered office is at 301 St. Vincent Street, Glasgow G2 5DD.
Chevron UKLtd., whose registered office is at Chevron House, 2 Portman Street, London W1H 0AN.
Conoco Norway Inc. U/A, whose registered office is at Haakon VII’s Gate, 0161 Oslo 1, Norway.
Conoco (U.K.) Ltd., whose registered office is at Park House, 116 Park Street, London W1Y 4NN.
Den Norske Stats Oljeselskap, A/S (STATOIL), whose registered office is at Lagardsveien 78, 4001 Stavanger, Norway.
Esso Norge A/S, whose registered office is at Haakon VII’s Gate 9, 0114 Oslo 1, Norway.
Enterprise Oil Norge Limited, whose registered office is at 5 Strand, London WC2N 5HU, and having its principal place of business at Lokkeveien 103 B, 4001 Stavanger, Norway.
Mobil Exploration Norway Inc., incorporated in the U.S.A. whose principal office is at 150 East 42nd Street, New York, N.Y. 10017, U.S.A., and whose principal place of business in Norway is at Strandgt 41-43, N-4001 Stavanger, Norway.
A/S Norske Shell, whose registered office is at Tullingsgate 2, 0166 Oslo 1, Norway.
Saga Petroleum a.s., whose registered office is at Maries Vei 20, N-1322 Hovik, Norway.

PART II DESCRIPTION OF PIPE-LINES
(1)	(2)	(3)	(4)	(5)
Route of the pipe-lines	
From	To	Number of pipe-lines lying along route	Nominal diameter of pipes in inches	Date brought into use
Murchison Platform	Dunlin Platform	1	16	1.9.80
Murchison Platform	Murchison Subsea Well 211/19-3	2	3.5	25.12.80
Murchison Subsea Well 211/19-2	Murchison Platform	2	3.5	25.12.80
Murchison Platform	Murchison Subsea Well 211/19-4	2	3.5	25.12.80