SCHEDULE 4 SPECIAL CONDITIONS SUBJECT TO WHICH LICENCES TO USE SPECIAL DESIGNATIONS OTHER THAN “UNTREATED” ARE GRANTED

PART II sterilised

B. Additional conditions applicable when the milk is heated by a continuous-flow method
1. Immediately after heating as aforesaid by a continuous-flow method the milk shall be put into the sterile containers in which it is to be supplied to the consumer. Such containers shall be filled and sealed at the premises at which the treatment has been carried out with such aseptic precautions as will ensure the protection of the milk from the risk of contamination.
2. The records of such recording thermometers as the licensing authority shall reasonably consider necessary to be installed in suitable places in the apparatus in which the milk is to be heated as aforesaid by a continuous-flow method shall be marked with graduations adequately spaced to give clear readings, and they shall be dated and preserved for a period of not less than three months.
3. Any apparatus in which the milk is to be heated as aforesaid by a continuous-flow method shall be provided with a device which shall automatically divert the flow of any milk which is not raised to the authorised temperature and automatically record each operation of the device. Such record shall be dated and preserved for a period of not less than three months.
4. Every container in which the milk heated as aforesaid by a continuous-flow method is transported, exposed or offered for sale shall be so closed and securely fastened that it is airtight.