PART III MANAGEMENT OF THE UNDERTAKING

33 Permanent lights on tidal works
1 After the completion of a tidal work the Commissioners shall at the outer extremity thereof exhibit every night from sunset to sunrise such lights, if any, and take such other steps, if any, for the prevention of danger to navigation as Trinity House may from time to time direct.
2 If the Commissioners fail to comply in any respect with a direction given under this section they shall be guilty of an offence and liable on summary conviction to a fine not exceeding the statutory maximum and on conviction on indictment to a fine.