Citation, commencement and interpretation
1. (1) These Regulations may be cited as the Social Security (Industrial Injuries) (Prescribed Diseases) Amendment (No.2) Regulations 1987 and shall come into force on 4th January 1988.
(2) These Regulations shall be read as one with the Social Security (Industrial Injuries) (Prescribed Diseases) Regulations 1985 (“the principal Regulations”).
S.I. 1985/967; the relevant amending instruments are S.I. 1986/1374, 1561 and 1987/335.