Part 3 Other taxes

Taxes relating to vehicles

69 Vehicle excise duty for vehicles with exceptional loads etc
(1) In—
(a) paragraph 6(2A)(a) of Schedule 1 to VERA 1994 (vehicles with exceptional loads),
(b) paragraph 9(3) of that Schedule (rigid goods vehicle which has weight exceeding 44,000 kg and is not an island goods vehicle), and
(c) paragraph 11(3) of that Schedule (tractive unit vehicle which has weight exceeding 44,000 kg and is not an island goods vehicle),
for “£1,585” substitute “£1,643”.
(2) The amendments made by this section have effect in relation to licences taken out on or after 1 April 2025.