Part 2

Digital verification services

Supplementary

Index of defined terms for this Part
54
The Table below lists provisions that define or otherwise explain terms defined for the purposes of this Part.
Term | Provision
accredited conformity assessment body | section 33 (6)
digital verification services | section 27 (2)
the DVS register | section 32 (2)
the DVS trust framework | section 28 (1)
supplementary code | section 29 (2)
supplementary note | section 36 (6)
S. 54 not in force at Royal Assent, see s. 142(1)
S. 54 in force at 1.12.2025 by S.I. 2025/1213, reg. 2