Part 1

Public protection requirements

Requirements

Public protection measures for enhanced duty premises and qualifying events
6
1
The person responsible for enhanced duty premises or a qualifying event must—
a
assess and keep under review the public protection measures that are appropriate to further the objectives mentioned in subsection (2), and
b
so far as is reasonably practicable, ensure that such measures are in place (in addition to the procedures required by section 5).
2
The objectives are—
a
to reduce the vulnerability of the premises or event to acts of terrorism;
b
to reduce the risk of physical harm being caused to individuals if an act of terrorism were to occur on the premises, at the event or in the immediate vicinity of the premises or event.
3
“Public protection measures” are measures relating to—
a
the monitoring of the premises or event and the immediate vicinity of the premises or event;
b
the movement of individuals into, out of and within the premises or event;
c
the physical safety and security of the premises or the premises at which the event is to be held;
d
the security of information in relation to the premises or event.
S. 6 not in force at Royal Assent, see s. 37(2)