Part 5

General

Short title and commencement
48
1
This Act may be cited as the Genetic Technology (Precision Breeding) Act 2023.
2
Part 1 comes into force on the day on which this Act is passed.
3
Parts 2 to 4 and sections 39 and 40 come into force—
a
so far as necessary to enable the exercise of any power to make regulations, on the day on which this Act is passed;
b
for remaining purposes, on such day as regulations may appoint.
4
Section 41 comes into force on such day as regulations may appoint.
5
The rest of this Part comes into force on the day on which this Act is passed.
6
Regulations under this section may appoint different days for different purposes.
7
Regulations may make transitional, transitory or saving provision in connection with the coming into force of any provision of this Act.
8
Regulations under this section are to be made by statutory instrument.
S. 48 in force at Royal Assent, see s. 48(5)